The Bombardment of Reims
Date: 2015-08-07T00:00:00+00:00
Keywords: World War; 1914-1918 -- France -- Reims; Reims (France) -- History

The Project Gutenberg eBook of The Bombardment of Reims

This ebook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this ebook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

Title: The Bombardment of Reims

Author: Barr Ferree

Release date: August 7, 2015 [eBook #49649]

Language: English

Credits: Produced by Brian Coe, Martin Pettit and the Online
Distributed Proofreading Team at http://www.pgdp.net (This
file was produced from images generously made available
by The Internet Archive/American Libraries.)

*** START OF THE PROJECT GUTENBERG EBOOK THE BOMBARDMENT OF REIMS ***

From "La Cathédrale de Reims," Libraire Centrale des Beaux-Arts, Paris.

THE WEST FRONT OF THE CATHEDRAL OF REIMS

The
BOMBARDMENT
of REIMS

By
Barr Ferree

New York
Leonard Scott Publication Company
1917

Copyright, 1917,
By Barr Ferree.
All rights reserved.

CONTENTS

The Bombardment of Reims | 7
Chronology of the Bombardment: |
1914 | 21
1915 | 33
1916 | 59
1917 | 87
Postscript | 111
The Buildings of Reims | 113
The Destruction of the Buildings of Reims | 122

ILLUSTRATIONS

The Bombardment of Reims | Frontispiece
From "La Cathédrale de Reims," Libraire Centrale des Beaux-Arts, Paris |
The Front at Reims in May, 1917 | 19
The West Portals | 64
From "La Cathédrale de Reims," Libraire Centrale des Beaux-Arts, Paris |
The Cathedral after the Bombardment of April, 1917: The Apse and South Transept | 96
From "L'Illustration" |
The Hôtel de Ville | 112

The Bombardment of Reims

The bombardment of Reims, and the attendant destruction of its cathedral, is an event that has particularly excited the indignation of the civilized world. The sacrifice has seemed so wanton and so unnecessary that the souls of those who have not known the great church by personal observation have cried out in indignation against the outrage, while to those who have known it, its long continued passion has aroused the feeling of an intense personal loss. No other episode of the Great War has accomplished such complete destruction of so great a work of art. Its blackened walls and broken statues are the most formidable indictment the Germans have yet raised against themselves. As an event in the War it stands unique among countless other inexcusable horrors, and it has, therefore seemed worth while to summarize briefly the dreadful doings at Reims, that the real nature of the hideous tragedy may be made apparent.

For an American, remote from the seat of war, to attempt a survey of the bombardment of Reims is a hazardous task. Yet I have ventured to do so because the continued dreadfulness of this great siege, which has lasted more than three years, is quite unknown in this country, and, even in the meagre details here set forth, not fully known in France. The bombardment of Reims has continued from September 3, 1914, without interruption, save for the few days of the German occupation in that month, and some days designated as "calm" in the daily reports. But these "calm" days form part of the history of the siege, since no one could tell at what hour the bombardment might be renewed.

Little as to the bombardment of Reims has appeared in the American papers, and not much more in the Paris papers. The official bulletins give so small space to it that they have been entirely neglected in the preparation of this chronology. More than once the papers published in Reims have complained of the silence of the Paris papers on the attacks on their beloved city, and have frequently referred to the importance attached to minor details elsewhere, while nothing at all has been said as to more important events at Reims.

The hand of the censor has at all times rested heavily on Reims, the local censor sometimes not permitting the publication of details that have appeared in the few references in Paris newspapers. At the beginning of the bombardment the papers of Reims published quite full details, giving the names and addresses of persons killed or wounded, and the location of buildings burned or otherwise injured in the bombardment. These items were speedily suppressed, and the greater part of the record in available publications is not much more detailed than is given in these pages.

But if details are wanting it is not impossible to draw an outline picture of the whole bombardment. This I have undertaken to do; and while I cannot hope, from an accurate point of view, that this work can have any value, I am not without hope that as a general review of the bombardment from the beginning, this little book may find a place in the vast literature of the war. Certainly the facts here gathered are quite unknown in America, and, in their entirety, are almost as little known in France, since no one in that besieged land as yet attempted a similar undertaking.

The present record covers the three years of the bombardment from September 3, 1914 to September 3, 1917. A siege extending over so considerable a period of time, attended as it has been, with months of ferocious assaults, with great loss of life, and the useless destruction of great works of art, may well be chronicled for that period. And this is the more the case since the details here gathered have not before been grouped together in their entirety.

It is much too soon to attempt a full history of the bombardment of Reims, but the outlines of the dreadful story may now be brought together. It should be sufficiently obvious that the bombardment of Reims is not a small episode in the war, but an event continuous from the very beginning.

The chronology here published has been compiled from the local newspapers published at Reims and at Paris. I have made use of "Le Courrier de la Champagne", published in Reims, "Le Petit Rémois", published in Paris from December 15, 1915, and the journal "Reims à Paris", also published in Paris from December, 1914. The editor of the latter paper having been called to the colours, it was merged with "La Marne" and has appeared as "Reims à Paris et la Marne" since October 4, 1916. The daily records of the bombardment, printed in "Le Courrier de la Champagne", are those compiled by its own staff. The records printed in the other papers are compiled from "Le Courrier de la Champagne" and "L'Éclaireur de l'Est", also printed in Reims. "Le Petit Rémois" has made free use of both these papers, and in addition has published the reports of its editor, M. Pierre Bienvenue, residing in Reims. Owing to the fury of the bombardment in April "Le Courrier" was forced to suspend publication for the time being, but "L'Éclaireur" was able to continue in a much reduced form.

The French Republic paid a fine tribute to this journalistic heroism when President Poincaré pinned the Cross of the Legion of Honour on the breast of M. Paul Dramas, the managing editor of "L'Éclaireur de l'Est" on June 18, 1917, when the same distinction was given to Cardinal Luçon, Archbishop of Reims, and Deputy Mayors J. de Bruignac and E. Charbonneaux, and some other heroic citizens. It is impossible to turn over the pages of these little Reims papers without a heartening sense of the courage that permitted their publication daily throughout a harrowing siege. Heroic journalism in a very true sense.

Among other sources of information special mention should be made of "Le Martyre de Reims", published anonymously in parts. It began with the admirable purpose of presenting a detailed summary of life and events in Reims during the bombardment, giving the names of persons killed or wounded, and the locality of buildings injured. The censor speedily fell afoul of this useful summary: names of persons and buildings were stricken out, as well as other details, and finally the diary came to a temporary end with Part 41.

I must mention also the "Journal d'un Rémois" by M. Henri Jadart, which appeared in "Les Champs de Bataille, Collection du Tour de France, Les Cités Meurtries", edited by M. Octave Beauchamp. M. Jadart is librarian and curator of the Museum of the City of Reims, and has kept in close touch with everything relating to his city. His "Bibliographie Rémoise", read before the Academy of Reims, of which he is the Secretary-General, at a meeting in Paris in June, 1916, is a useful record of the extensive literature produced by the bombardment. The series "Les Cités Meurtries" also includes "Reims sous les obus en 1915" by Mlle. Alice Martin, carrying the story into that year. Mention should also be made of the publication "Reims et la Marne. Almanach de la Guerre, 1914-1915", published in Paris by M. Jules Matot. This book contains no calendar of the bombardment, but a daily summary of general events at Reims, and therefore it is more particularly of local interest. The article "Trois Semaines à Reims" by General Dubois, published in "La Revue" for Oct.-Nov., 1914, contains some useful notes on the first weeks of the bombardment. Just as my chronology had been completed I obtained the new book by M. Jules Poirier "Reims (1 Août—31 Décembre, 1914)", giving a survey of the early events of the war as they related to Reims, and summarizing the daily events in diary form. It has given me some additional facts on the first five months of the bombardment. "Sous les Bombes" by Mlle. Clotilde Jehanne Remy, of which two parts have appeared, is a personal diary of life in Reims during the bombardment.

Although I have been obliged to place complete dependence on printed records, it should be pointed out that there is often a wide divergence between them. The statements printed in the two Reims newspapers do not always agree for the same day, and "Le Petit Rémois", in endeavouring to present a fair and just account, has more than once printed the divergent reports, and clarified the matter by adding its own summary, which often differed from the other two! I fancy, however, that many of these differences are apparent only, and are perhaps not so striking as they first appear.

It has seemed desirable to give the details of the bombardment as far as the local reports permit. That is to say, the hours of the bombardment, the number of shells, the number of persons killed or wounded. The hours of the bombardment are an interesting index to the agitated daily life at Reims. The number of shells is also of interest as indicating the possible intensity of the attack. But as ammunition of all kinds and sizes, huge and small shells, shrapnel, incendiary and asphyxiating bombs and many other kinds of projectiles have been used in the siege, a mere statement of number of shells hardly gives a proper index to the horror of any one bombardment. But the shell records as to kind are highly incomplete in the published reports, and it has not seemed worth while to make an effort to indicate them. In the dreadful days of March, April, May and June, 1917, when the fall of shells was colossal, even the newspapers gave up attempts at numbering them, and it is probable the actual totals will never be known. The number of persons killed and wounded help also to show the severity of the bombardments, and have no other purpose in this survey. I can scarcely hope that my records of these items approach completeness, and they have been omitted from April, May and June, 1917. The number of persons killed or wounded are, for the most part, those of the civilian population of Reims.

In addition to bombardment from guns Reims has suffered from the German aviators. I have designated these birds of prey as "Taube", as an economical form of expression. Every considerable bombardment was preceded by these visitors. Nearly every day one or more of them appeared above Reims, and they seem to have been looked upon as so much matter of course that I suspect their presence was often unnoted in the reports. Whenever possible they were eagerly welcomed by the guns of Reims, and hence it followed that, not only was the city subject to the bombardment of the enemy, but on several occasions injury was done in it by antiaerial shells falling back.

A mere glance at the daily records shows that, until March, 1917, no definite purpose was behind this bombardment. It was continued for two years and a half for no other purpose than to annoy the French. Else why these daily bombardments of a few shells only, these days of calm or of little doing, these spurts of agony, bringing sudden death or useless destruction, only to be followed by lapses into silence? Had the destruction of Reims been seriously undertaken it might, I suppose, have been accomplished long since. But it pleased the enemy to irritate rather than to destroy; a little harm day by day, a little annoyance, more or less, spread over a considerable period of time, with occasional outbursts of great violence, this was the programme. Or, more dreadful still, when the German forces met with defeat, the guns were opened afresh on the helpless cathedral, that it might be wounded again for disasters it had in no sense been party to. While doubtless all this has been thoroughly understood by the French military authorities, little was known of it to the outside world, for little that went on at Reims was known anywhere. There were many other and more important things in the Great War that affected the future of France and of the world. Humanity held its breath while the heroic battle of Verdun was in progress, because it was a military event of the first magnitude. But so little has been heard of Reims that a revelation of its daily martyrdom must come as a shock to those who have closely followed the war.

The story presented from the month of March, 1917, is quite different from anything that preceded. Very obviously the foolish game of play-war was abandoned, and a real effort made to accomplish the destruction of the city. The mind pales before the needless horrors of these months, so inefficiently indicated by a record of continuous and continued bombardment. So full of horror has been this time that the local papers speak of a daily fall of 600 shells, or even 1000 shells, as a welcome relief from days just passed!

And the cathedral. That, of course, is the one central overpowering thing that excites the interest of the world in the bombardment of Reims. This is not so with the unfortunate people of Reims, who have seen their loved ones killed, their houses ruined, their occupations gone, and who have suffered daily privation and martyrdom. Reims is not alone among the cities and districts of France in such horrors, but its cathedral is one of the treasures of the world, and in this war of great crimes no greater crime has been attempted than the destruction of this splendid church.

Three years ago its vast bulk and massive towers rose grandly above its surrounding buildings in all the pride of lasting permanency. For seven hundred years these stones had cried aloud to the glory of God and the supreme genius of its French builders and decorators. France—that treasure-house of architectural masterpieces—had no more noble building than this, so dear to the French people by reason of the supremacy of its art and as the coronation church of their kings, and once the emblem and the expression of their nationality.

In its present dismantled, battered, more than half-ruined state, the cathedral of Reims is of all the unnecessary sacrifices in the War the most unnecessary. It has been too great and too good a thing to disappear from the world without leaving an empty place that cannot be filled. Once, in far back September, 1914, the merciless barbarian encamped before its holy portals. There he stayed for nine days, and, leaving in haste, presently bombarded it, so that his own wounded, temporarily placed within it for safety, were burned alive under the protecting flag of the Red Cross. A pitiable comment on his regard for great churches and the well-being of the wounded.

Since then—September 12, 1914, to be exact—no good news has come out of Reims. Yet of this we may be certain: devoted as the French are to their great national church, they will gladly sacrifice it utterly if that sacrifice be required to thrust out the barbaric invading hordes that know only hate of the good, the true, the beautiful.

The catastrophe of Reims supplies a very sure index as to what passes as the quality of the German mind. Although of all churches the most French, the cathedral of Reims belongs to the whole world, a rare, beautiful and precious structure, hallowed with great memories and endowed with exquisite art. The question is thus very simple: is the world better with the cathedral of Reims or without it? The Germans seem unquestionably to have decreed its destruction. Of this the record of the bombardment offers ample proof. But as yet the cathedral-destroyers have offered no word, no hint, no suggestion, as to how or why the world will be bettered by the wilful destruction of this matchless church.

THE FRONT AT REIMS IN MAY, 1917

1914

September, 1914

2 | French army evacuated Reims in the night.

3

Taube dropped 2 bombs 9:15 A. M.; Dr. Langlet, Mayor of Reims, issued proclamation announcing the approach of the Germans and urging calm. German officers enter Reims 8:30 P. M.

4

First bombardment 9:22 A. M., 176 shells, many killed and wounded; minor injuries to the cathedral, glass broken; St. Remi and St. André injured; German troops enter in afternoon; anniversary of the German occupation of 1870.

5 | German occupation.
6 | German occupation.
7 | German occupation.
8 | German occupation.
9 | German occupation.
10 | German occupation.
11 | German occupation.
12 | German troops evacuate Reims in afternoon; French officers appear 6:30 P. M.

13

French troops re-enter Reims 6 A. M.; Taube 5 P. M.; last vespers in the cathedral (in chapel of the Cardinal): Te Deum for Benedict XV.

14

Cannonade from 5 A. M.; bombardment 9:45 A. M. to 12:15 P. M.; renewed 1 to 3:30 P. M.; 59 killed, many wounded; cannonade all night.

15 | Taubes 5 A. M.; bombardment 9:30 to 11 A. M.; renewed 4 P. M., 13 killed.
16 | Bombardment 3:30 A. M. to 6:30 P. M., 30 killed.
17 | Bombardment from 9 A. M.; renewed 2:30 to 4 P. M., 3 shells on cathedral.
18 | Cannonade from 2 A. M.; bombardment from 8:15 A. M., 13 shells on cathedral, 37 killed; Sous-Préfecture burned.

19

Bombardment 7:45 A. M. to 4 P. M., 16 shells on cathedral; cathedral took fire from incendiary bomb 2:30 P. M.; cathedral and Archiepiscopal Palace burned; 32 killed; artillery all night.

20 | Bombardment 9:30 to 11 A. M.; renewed 3:30 to 4:30 P. M.
21 | Calm; artillery at night.
22 | Bombardment 12 to 3:30 P. M., 7 killed, Cardinal Luçon returned to Reims from Conclave at Rome.
23 | Taube 6 A. M.; bombardment 3 to 5 P. M.

24

Taube 6 A. M.; bombardment 9:30 to 11 A. M.; renewed 3 to 5 P. M.; bomb struck cathedral and Civil Hospital; 10 killed; cannonade all night.

25 | Trenches bombarded in morning; Reims bombarded 3 to 5 P. M.; bomb struck St. Remi, 1 killed; cannonade all night.
26 | Bombardment 11:45 A. M. to 12:15 P. M., 13 killed; renewed 3:30 to 4:30 P. M., 17 killed.
27 | Bombardment 3:30 P. M.; cannonade at night.
28 | Bombardment 2:30 P. M.; cannonade at night.
29 | Bombardment 9:30 to 10:30 A. M.; renewed 4 to 6 P. M.; again 9 P. M. to 6 A. M., 3 killed, many wounded.
30 | Bombardment continued to 6 A. M.; renewed 8 A. M. and 4:30 P. M.

October, 1914

1 | Some shells 9 A. M.; 2 aerial bombs 5:15 P. M.; cannonade at night.
2 | Bombardment 4:30 P. M., 2 shells, 3 killed.
3 | Bombardment 10:30 A. M. to 3 P. M., 1 killed, 5 or 6 wounded.
4 | Bombardment 9 A. M.; renewed 12 to 1 P. M., 50 shells.
5 | Aerial combat; bombardment 9 to 11 A. M., 7 killed, 7 wounded; renewed 3 P. M. to 10 A. M.
6 | Bombardment continued to 10 A. M., 200 shells; 3 spies shot 5 A. M.
7 | Bombardment 12:05 to 2 P. M., 50 shells, 2 killed, 2 wounded; renewed 8 P. M.
8 | 1 shell in morning; bombardment 3:30 P. M., 15 shells, 1 killed, 1 wounded.
9 | Bombardment at night, 20 shells to 5 A. M.
10 | Bombardment continued to 5 A. M. Taube 11 A. M.
11 | Calm.
12 | Bombardment 2 to 5 P. M., 3 shells on cathedral 3 P. M., 2 killed, 2 wounded.

13

Bombardment from 2 A. M., 1 shell on cathedral 3 A. M.; renewed 9:30 to 11 A. M., 2 wounded. Taube dropped bomb 2:30 P. M.; bombardment renewed; violent artillery around Reims at night.

14 | Bombardment 2 to 3:30 P. M., 4 wounded, artillery at night.
15 | Calm.
16 | Bombardment 3:30 to 5 P. M., 2 wounded.
17 | Calm.
18 | Calm.
19 | Calm.
20 | Calm.
21 | Bombardment 2 to 5:30 P. M., 1 wounded.
22 | Bombardment 3:30 P. M.; cannonade at night.
23 | 3 Taube bombs 11 A. M., 2 wounded; Taube 2 P. M.; bombardment 4 to 5 P. M., 1 wounded.
24 | Bombardment 2 P. M.; cannonade at night.
25 | Bombardment to noon; renewed 2 P. M., 4 killed, 8 wounded; distant cannonade at night.
26 | Calm; violent cannonade at night.
27 | Bombardment 9:15 A. M.
28 | Tranquil. 127 persons wounded since September 4.
29 | Bombardment 4 to 6 A. M., 50 shells; cannonade at night.
30 | Bombardment 3 to 5:30 P. M., 50 to 60 shells, 1 killed, 2 wounded; renewed 9:30 P. M. to 9 A. M.
31 | Bombardment continued to 9 A. M., 60 to 70 shells, 2 killed, 2 wounded; renewed 4 to 5 P. M., 20 shells.

November, 1914

1 | Taube dropped 2 bombs 10:30 A. M.; bombardment 11:30 A. M., 6 shells, 2 wounded; renewed 2:30 to 5 P. M.

2

Bombardment 9:30 to 11 A. M., 20 shells. Taube dropped bomb 2:10 P. M.; bombardment renewed 2:30 to 4:30 P. M., 70 shells.

3 | Bombardment from 9:30 A. M.; renewed 4 to 6 P. M.; again at 8:45 P. M., 8 killed, 2 wounded.
4 | Taube dropped 4 bombs 4 P. M.; bombardment, 30 shells, 2 wounded; renewed 11 P. M.
5 | Taube 7:30 A. M.; violent bombardment 2 to 6 P. M.; renewed 8 P. M. to 5 A. M.; 300 shells, 9 killed, 15 wounded.
6 | Bombardment continued to 5 A. M.; renewed 11 A. M.; again 10 P. M.; 2 shells.
7 | Bombardment 8 P. M. to midnight.
8 | Dr. Langlet, Mayor of Reims, decorated with Legion of Honour. Bombardment 7 to 8:30 P. M.; 50 shells.
9 | Calm.
10 | Day calm; bombardment 10 to 11 P. M.; 20 shells.
11 | Bombardment 8 to 9 A. M.; renewed 12 to 2:15 P. M.

12

Bombardment 1:30 to 5:30 P. M.; cathedral apse pinnacle demolished; shrapnel fell within near high altar; renewed 8 P. M. to 5:10 A. M.; 400 shells for the day.

13 | Bombardment continued to 5:10 A. M.; some shells in morning and at 2:30 P. M.
14 | Taube 7 A. M.; bombardment 9 A. M., 2 shells; Taube dropped fusées 3 P. M.; cannonade at night.
15 | Taube dropped bomb 8 A. M.
16 | Some shells in morning and at 2 P. M.; heavy bombardment 8:30 P. M. to 5 A. M.; apse chapel in St. Remi demolished.
17 | Bombardment to 5 A. M.; renewed 2:30 P. M.; Taube dropped 2 bombs.
18 | Taube dropped 2 bombs 7 A. M.; bombardment 9 A. M. to 5 P. M.
19 | Bombardment 3 A. M.; day somewhat calm.
20 | Some shells on interdicted zone; bombardment 10 P. M. to 4:30 A. M., 3 wounded.
21 | Bombardment continued to 4:30 A. M.; renewed 2:30 P. M., 100 shells.

22

Heavy bombardment 9:30 A. M. to noon; renewed 2 to 5:30 P. M.; 2 shells on cathedral; 6 killed, 24 wounded; again 8 to 11 P. M.

23 | Bombardment 8 A. M. to 6 P. M.; cannonade all night.
24 | Bombardment 2:30 to 4:30 P. M., 50 shells.
25 | Bombardment 6 A. M., 20 shells.
26 | Bombardment 8 A. M. to 5:30 P. M., 28 killed, 23 wounded.
27 | Bombardment from midnight; relatively calm to 2 P. M.; bombardment renewed 2:15 to 6 P. M.; again 10 P. M. to 2 A. M.
28 | Bombardment continued to 2 A. M.; renewed 3:30 A. M., 27 killed.
29 | Calm.
30 | Bombardment 10:30 A. M. to noon.

December, 1914

1 | Intermittent bombardment.
2 | Bombardment 10 A. M.
3 | Bombardment 9 A. M., 2 or 3 shells.
4 | Taube 11:30 A. M.; bombardment 1:30 to 8 P. M.
5 | Bombardment 3:30 A. M. to noon.
6 | Taube dropped 3 bombs 11 A. M.
7 | Bombardment 5 to 6 P. M., 40 shells.
8 | Bombardment 1 to 3 P. M., 50 shells.
9 | Bombardment in afternoon, 12 shells; renewed in evening, 6 shells.
10 | Shrapnel morning and afternoon.
11 | Bombardment in morning, 4 shells; renewed 5:30 to 6:30 P. M.
12 | Bombardment on vacant land, 10 A. M., 14 shells.
13 | Bombardment 9:30 to 11 A. M., 50 shells. President Poincaré visited Reims.
14 | Bombardment in morning; renewed in evening, 20 shells.
15 | Bombardment 10 A. M.; renewed 4 P. M., 30 shells.
16 | Bombardment 5:30 to 6 P. M., 8 shells; renewed 9 P. M.
17 | Taube dropped bomb 9 A. M.; bombardment 11:10 A. M. to dawn, more than 200 shells at night, 2 killed, 9 wounded.
18 | Bombardment continued to dawn; renewed morning and afternoon.
19 | Bombardment 11 A. M. to 12:30 P. M., 13 wounded.
20 | Bombardment 6 P. M., 50 shells.
21 | Bombardment 11 A. M., 50 shells; Taube 4 P. M.
22 | 2 Taubes 3 P. M.; bombardment 3:30 P. M., 30 shells; artillery in evening to 9:30 P. M.
23 | Calm.
24 | Taube 3:30 P. M.; bombardment in evening, 8 shells.
25 | Christmas Day. Taube 3:30 P. M., dropped 4 bombs; bombardment 5:15 P. M., 30 shells.
26 | Taube 2:30 P. M.; bombardment 5 to 6 P. M., 40 shells.
27 | Bombardment 5 to 6:30 P. M., 10 shells.
28 | Bombardment 11:30 A. M., 15 shells; 2 shells in evening.
29 | Bombardment 5 to 6 P. M., 14 shells.
30 | Bombardment 11 A. M.; renewed 5 to 6 P. M., 20 shells.
31 | Bombardment 11 A. M., 2 killed, 3 wounded; cannonade at night.

1915

January, 1915

1 | Relatively calm; bombardment at night, 30 shells.
2 | Bombardment 3 to 4 P. M.; renewed 9 P. M.
3 | Bombardment in morning.
4 | Bombardment 10 A. M.; renewed 5 to 6 P. M.
5 | Bombardment in morning; renewed in evening; 3 killed.
6 | Bombardment in morning, 4 shells; renewed 5:30 P. M., 12 shells.
7 | Bombardment from 11 A. M., 108 shells.
8 | Bombardment all day; 86 shells at night; 3 killed, 3 wounded.
9 | Copious bombardment.
10 | Bombardment in morning; renewed 5:30 P. M.
11 | Bombardment 5:30 P. M.
12 | Bombardment in morning; renewed 3:30 P. M.; again 5:30 P. M.
13 | Bombardment 11 A. M.; renewed in afternoon and night.
14 | No report available.
15 | Bombardment 8 P. M.
16 | Bombardment in afternoon.
17 | Bombardment 4:30 P. M.; renewed 7 P. M.
18 | Bombardment 1 P. M., 3 killed; renewed 4 to 5 P. M.; again 9 P. M.
19 | Bombardment 6 P. M.
20 | Copious bombardment.
21 | Bombardment at noon.
22 | Bombardment 6 to 7 P. M.
23 | Bombardment in afternoon; renewed 9 P. M.
24 | Bombardment 8:30 to 9 A. M.
25 | Bombardment 8:30 P. M.
26 | Bombardment 4:30 A. M.; renewed in evening.
27 | Kaiser's birthday; bombardment afternoon and evening.
28 | Heavy bombardment; renewed 5:30 P. M.
29 | Bombardment 3 to 4:30 P. M.; renewed 8 P. M.
30 | Bombardment in morning; renewed 5 P. M.
31 | Bombardment 6 A. M.

February, 1915

1 | Calm.
2 | Calm.
3 | Bombardment of vacant land in morning; renewed 2 P. M.; again 6 P. M.
4 | Bombardment 11:30 A. M. to 1 P. M.; renewed at night.
5 | Bombardment in evening.
6 | Copious bombardment.
7 | Calm.
8 | Some small calibre shells in morning.
9 | Bombardment 12:15 P. M.; renewed 3 P. M., 1 killed, 3 wounded.
10 | Some shells.
11 | Calm.
12 | Bombardment 1 P. M.
13 | Bombardment 11 A. M.
14 | Bombardment in morning.
15 | Calm.
16 | Bombardment 5 P. M.
17 | Bombardment in afternoon, 1 killed, 3 wounded.
18 | Bombardment 11 A. M. and in afternoon, 9 killed, several wounded.
19 | Bombardment 9 A. M.
20 | Bombardment 9 P. M.
21 | Bombardment 2:30 P. M.; ferociously renewed 9 P. M. to 2:30 A. M.
22 | Bombardment continued to 2:30 A. M., 2000 shells, many killed and wounded; renewed in day, 4 killed.
23 | Bombardment continued.
24 | Bombardment 10:15 A. M.; renewed 7 P. M.; Taube dropped bomb.
25 | Bombardment from 7 A. M.
26 | Bombardment from 9 A. M.; renewed 1 to 5 P. M.; 2 shells on cathedral.
27 | Bombardment from 6 A. M.; renewed in afternoon.
28 | Bombardment in morning.

March, 1915

1 | Day calm; bombardment at night; several killed and wounded.
2 | Bombardment 12 to 5 P. M.; renewed 9:30 P. M., 2 wounded.
3 | Bombardment morning and afternoon, 4 killed, 14 wounded.
4 | Bombardment 11 A. M. to 1:30 P. M., 1 killed, 6 wounded; renewed 2 to 5:30 P. M., 3 killed, 2 wounded.
5 | Bombardment 9 A. M. to 2 P. M., 1 killed, 2 wounded; renewed 4 P. M.; again 8 to 9:30 P. M., 1 killed, 4 wounded.
6 | Bombardment in morning, 3 wounded.
7 | Bombardment most of the day.
8 | Bombardment continued, and at night.
9 | Bombardment continued, 8 wounded; renewed 8 P. M. to 4 A. M.
10 | Bombardment continued to 4 A. M., 1 killed, 1 wounded; renewed 5 P. M.; again from 7:30 P. M.
11 | Bombardment 5:30 P. M.; renewed 8 P. M.
12 | Day calm; bombardment from 7:30 P. M., 1 wounded.
13 | Bombardment 10 A. M., 2 victims; renewed 8 P. M. to 4 A. M.; Taube in afternoon.
14 | Bombardment continued to 4 A. M.; renewed in day, 4 wounded.
15 | Bombardment 4 A. M.; renewed 9 A. M.; again 5 to 6 P. M., 4 wounded.
16 | Calm; some shells at night.
17 | Bombardment 2:15 to 4 P. M.
18 | Day relatively calm; some shells.
19 | Moderate bombardment; some shells 5 P. M.
20 | Unimportant bombardment in afternoon.
21 | Bombardment 4 A. M.; Taubes dropped bombs in morning; some shells in evening.
22 | Day relatively calm; some shells 6 P. M.
23 | Bombardment 11 A. M. to noon.
24 | Bombardment in morning; renewed 2 to 4 P. M., again 10 P. M.
25 | Bombardment afternoon and night.
26 | Intermittent bombardment.
27 | Bombardment morning and afternoon.
28 | Bombardment morning and afternoon; Taube dropped bomb on cathedral apse.
29 | Bombardment continued.
30 | Taube dropped 3 bombs 7 A. M.
31 | Almost complete calm.

April, 1915

1 | Taube dropped 4 bombs 7 A. M.; bombardment in afternoon.
2 | Taube dropped bombs 6 A. M.
3 | Unimportant bombardment.
4 | Easter Day. Nothing to note.
5 | Bombardment on vacant land.
6 | Nothing to note.
7 | Nothing to note.
8 | Intense bombardment 9 P. M. to 2 A. M.
9 | Bombardment continued to 2 A. M.; no shells in the day.
10 | Nothing to note.
11 | Unimportant bombardment.
12 | No report available.
13 | Almost calm; some incendiary bombs 4 P. M.; shells 9 P. M.
14 | No report available.
15 | Taube dropped 4 bombs 7 A. M.
16 | Taube 6 A. M.; bombardment 4:30 to 6:30 P. M.
17 | Bombardment continued.
18 | Taube dropped 3 bombs 5:30 A. M.; bombardment 5 P. M.
19 | Some incendiary bombs 3 P. M.
20 | Incendiary bombs 5 A. M.; bombardment continued through day.
21 | Bombardment 5 to 7 P. M.; renewed at night.
22 | Incendiary bombs 10 A. M.; bombardment in afternoon.
23 | Calm.
24 | Bombardment 9:30 A. M.; afternoon and night calm.
25 | Bombardment 11:30 A. M.; renewed 4 P. M.
26 | Some shells in morning.
27 | Calm.
28 | Bombardment 10:30 A. M.; renewed 4 to 5 P. M.; again 7 to 11 P. M.
29 | Taubes in morning; bombardment in afternoon.
30 | Bombardment 7:30 A. M., 20 shells; violent bombardment 5 to 7 P. M.

May, 1915

1 | Taube 4:30 A. M.; bombardment morning and afternoon.
2 | Bombardment in morning.
3 | Bombardment 7 A. M.
4 | Bombardment 7 A. M.; renewed 5 to 6 P. M.
5 | Bombardment 10 A. M.
6 | Bombardment 9 A. M.; renewed 3 to 5 P. M.
7 | Bombardment 6:30 A. M.
8 | Bombardment 9:30 A. M.
9 | Bombardment in morning.
10 | Taubes dropped 2 bombs 5:30 A. M.; rifle fire at night.
11 | Bombardment morning and afternoon.
12 | Bombardment in morning.
13 | Infantry fire on French lines at night.
14 | Bombardment in morning.
15 | Taubes and bombardment in morning.
16 | More intense bombardment.
17 | Calm.
18 | Calm.
19 | Calm.
20 | Bombardment in morning, 2 or 3 shells.
21 | Bombardment 9 P. M.
22 | Bombardment at noon, 20 shells.
23 | Calm; a few shells at midnight.
24 | General calm.
25 | Bombardment at night.
26 | Calm.
27 | Calm.
28 | Bombardment in afternoon.
29 | No shells; some rifle shots in sector at night.
30 | Bombardment in day.
31 | Taube; bombardment in afternoon.

June, 1915

1 | Bombardment 9 A. M. to noon.
2 | Day calm; Germans bombard French aeros 7 A. M.
3 | Bombardment 9 to 11 A. M.; renewed 5 to 6:30 P. M.
4 | Bombardment 5 to 6 P. M.
5 | Tranquil.
6 | Brief bombardment.
7 | Violent artillery combat on front, 1 to 4 A. M., 6 shells on Reims.
8 | Calm.
9 | Calm.
10 | Bombardment in afternoon.
11 | Nothing to note.
12 | Nothing to note; violent artillery fire on front east of Reims at night.
13 | Nothing to note.
14 | No report available.
15 | Bombardment, 2 or 3 shells; renewed 11 to 11:30 P. M., 80 shells, some on cathedral.
16 | No report available.
17 | Bombardment 10 A. M., 3 or 4 shells.
18 | Calm.
19 | Bombardment in afternoon.
20 | German fire on French aeros.
21 | Nothing to note.
22 | Nothing to note.
23 | Nothing to note.
24 | Nothing to note.
25 | Nothing to note; French artillery at night; no response.
26 | Nothing to note; French artillery in day; no response.
27 | Bombardment from 6:15 A. M.
28 | Nothing to note.
29 | Bombardment in morning.
30 | Bombardment in afternoon.

July, 1915

1 | Bombardment in morning; renewed 5:30 P. M.
2 | Calm.
3 | German fire on French aeros in morning; bombardment 9 to 9:30 P. M.
4 | Bombardment 3 to 6 P. M.
5 | Bombardment 4:30 P. M.
6 | Nothing to note.
7 | Nothing to note.
8 | Nothing to note.
9 | Nothing to note.
10 | Nothing to note.
11 | Bombardment 10 A. M. to 2 P. M.
12 | Nothing to note.
13 | Nothing to note.
14 | Bombardment 2 P. M.
15 | Calm.
16 | Calm.
17 | Bombardment 10 A. M. to noon, 20 shells, 1 killed, 1 wounded.
18 | Copious bombardment.
19 | Bombardment 3:30 A. M.; renewed 9 A. M.; again 4 P. M.
20 | Taube 5 A. M.; bombardment 11 A. M. to 12:15 P. M.
21 | Taube 7 A. M., 1 shell; aeros at night.
22 | Calm; artillery on front at night.
23 | Bombardment 11:30 A. M.; renewed 6:45 P. M.; again 11 to 11:20 P. M.
24 | Bombardment 9:30 to 10:15 A. M.; renewed at night, 12 shells.
25 | Calm.
26 | Calm; violent cannonade at night.
27 | Bombardment 5:30 P. M.
29 | Bombardment 8 A. M.; renewed at night.
30 | Bombardment 6 P. M., 12 shells; artillery on all fronts at night.
31 | Some shells in day.

August, 1915

1 | No report available.
2 | Bombardment 9:30 A. M., 2 bombs on faubourgs; renewed 5 P. M.
3 | Nothing to note.
4 | Nothing to note.
5 | Some shells 5:30 P. M.
6 | French aviator violently cannonaded.
7 | Nothing to note; violent cannonade around Reims at night.
8 | Cannonade around Reims in day; some shells 5:15 P. M.; incendiary bombs at night.
9 | Cannonade on front at night.
10 | Unimportant bombardment.
11 | No report available.
12 | No shells on Reims; artillery actions on near-by places.
13 | Calm.
14 | Calm.
15 | No report available.
16 | Calm.
17 | Some shells in afternoon.
18 | Bombardment from 10:40 A. M.; some victims.
19 | Bombardment 2 to 3:30 P. M.; some killed and wounded.
20 | Bombardment 2 to 3:30 P. M.; some victims.
21 | Some shells 10 A. M.; heavy bombardment 2 to 3:30 P. M., some victims.
22 | Some shells in morning; bombardment 2 to 3:30 P. M.
23 | Calm; fire on Taube.
24 | Fire on Taube; some shells 5 P. M.
25 | Taube dropped 3 bombs 5:20 P. M., 1 killed; bombardment 6 to 7:10 P. M., 150 shells, 1 killed, 4 wounded.
26 | Calm.
27 | Bombardment 4:30 P. M.
28 | Calm.
29 | Bombardment 2:45 P. M.; renewed 5 P. M., 1 killed; cannonade at night.
30 | Calm.
31 | Bombardment 7:30 A. M.; rest of day calm.

September, 1915

1 | Bombardment 11 A. M. to noon, 1 wounded; renewed 1 to 1:30 P. M., 2 wounded; 100 shells for the day.
2 | Bombardment 10 to 10:15 A. M.
3 | Bombardment 10 A. M.; renewed 3:15 P. M.
4 | Anniversary of first bombardment. Bombardment 4 A. M., 20 shells; renewed 5 P. M.
5 | Calm.
6 | Calm.
7 | Calm.
8 | Calm.
9 | No shells; French cannonade morning and afternoon.
10 | Artillery duel; some shells 10 A. M.
11 | Day calm; French artillery and German fire on aeros in afternoon.
12 | Day calm; bombardment 11:40 P. M.
13 | Bombardment 10 A. M.; cannonade at night.
14 | Calm.
15 | Calm.
16 | Calm.
17 | Bombardment in afternoon, 6 shells.
18 | Bombardment 7 A. M.; cannonade at night.

19

Anniversary of cathedral fire in 1914; Way of the Cross by the priests of Reims in the cathedral. French artillery 4 A. M., feeble
response; bombardment in morning and at 5 P. M., 1 wounded.

20 | Bombardment 3 P. M.; cannonade at night.
21 | Bombardment 9:30 to 10 A. M.; renewed 4 to 5 P. M.
22 | Bombardment morning and afternoon, 30 shells.
23 | Bombardment 3 to 5:30 P. M., 150 shells, 3 killed, several wounded.
24 | Bombardment 4 to 5:30 P. M., 100 shells, 4 killed, 2 wounded.
25 | Bombardment 10 A. M., 20 shells, 1 killed; renewed 3 P. M.; 100 shells for the day.
26 | French artillery.
27 | Artillery on left front; some shells on Reims 3 P. M.
28 | 2 or 3 shells on faubourgs; cannonade on front.
29 | No shells on Reims; less cannonade.
30 | Calm.

October, 1915

1 | Calm.
2 | Calm.
3 | Artillery duel; some shells on faubourgs at night.
4 | No report available.
5 | Some shrapnel on faubourgs in afternoon.
6 | Some shells; French artillery at night.
7 | French artillery; no shells on Reims.
8 | Calm.
9 | Calm.
10 | Some shrapnel in afternoon.
11 | Calm.
12 | Bombardment 10:30 A. M.; renewed 3 P. M.; again 4 P. M.; French aeros over German lines.
13 | Some shells in morning.
14 | Bombardment 2:30 to 5 P. M.; French aeros.
15 | Taube dropped bomb in afternoon; bombardment in evening.
16 | Taube dropped bombs.
17 | Calm in sector; 3 shells at night.
18 | A few shells 5 P. M.
19 | French artillery 5 A. M.; bombardment 8 to 11 A. M., 500 shells, some wounded.
20 | Bombardment 1:30 to 8 P. M., more than 200 shells and 100 shrapnel; 6 shells at night, 2 killed, 6 wounded.
21 | Calm.
22 | Some shells afternoon and night.
23 | Calm.
24 | Calm.
25 | Calm.
26 | Calm.
27 | Calm.
28 | 1 shell 4:45 P. M.
29 | Calm; complete stoppage of artillery on front.
30 | Complete calm.
31 | Incessant cannonade on front.

November, 1915

1 | Calm.
2 | Bombardment 11 A. M.; renewed 2 P. M.
3 | Some shells morning and afternoon.
4 | Calm.
5 | Calm; cannonade on front.
6 | Calm; cannonade on front.
7 | Calm; a shell at night.
8 | Calm.
9 | Calm.
10 | Calm; cannonade on front in afternoon.
11 | Calm; cannonade on front in afternoon.
12 | Calm.
13 | 1 bomb 4:30 P. M.
14 | Calm; French artillery, no response.
15 | Calm.
16 | No shells; artillery on front all afternoon.
17 | No shells; artillery on front in afternoon.
18 | Calm.
19 | Artillery action; some shells in morning.
20 | Artillery; no shells on Reims.
21 | Artillery all day; no shells on Reims.
22 | Artillery in morning; fire on aeros in afternoon.
23 | French artillery in afternoon.
24 | Artillery action; 4 shells 2:15 P. M.
25 | Calm.
26 | Some shells.
27 | Calm.
28 | French artillery; no shells on Reims.
29 | Artillery in afternoon.
30 | Some shells in morning.

December, 1915

1 | Bombardment in morning.
2 | Artillery action; some shrapnel.
3 | Bombardment in morning, 1 killed.
4 | Bombardment 8:30 A. M. to 1:30 P. M., 50 shells.
5 | Some shells day and night.
6 | Calm.
7 | Some shrapnel in morning.
8 | Calm; 1 shell 9:30 A. M.
9 | French artillery 4 P. M.; no response.
10 | Calm.
11 | French artillery 12:30 P. M.; German response 4:30 P. M.; no shells on Reims.
12 | Artillery duel 3:30 P. M.
13 | Cannonade 7 A. M.; renewed 10:30 A. M.
14 | Calm; French aero over German lines 2:30 P. M.
15 | Cannonade 6:30 to 8 A. M.
16 | Calm.
17 | Short violent cannonade at noon.
18 | French artillery all day; no shells on Reims.
19 | 15 shells on faubourgs in afternoon; intermittent cannonade at night.
20 | Bombardment 10 A. M.; renewed in afternoon, 1 wounded.
21 | 1 shell in afternoon.
22 | Calm; French artillery at long intervals.
23 | Calm.
24 | Calm.
25 | Christmas Day. Bombardment 2 to 3 P. M., 400 shells.
26 | Reciprocal cannonade.
27 | Heavy bombardment from 9 A. M., 2 killed, 14 wounded.
28 | Artillery duel 9:30 A. M.
29 | Cannonade 9 A. M.; 1 shell 11 A. M.; renewed in afternoon, again at 9 P. M.; again at 11 P. M.
30 | Intense cannonade in Reims sector in afternoon.
31 | Calm; Taube 2:30 P. M.

1916

January, 1916

1 | Artillery duel at night.
2 | Artillery duel in afternoon; artillery at night.
3 | Nothing to note.
4 | French artillery; some shells on outskirts.
5 | Taube; some shells.
6 | Day calm; French artillery at night; small response.
7 | Calm; artillery to left, 4 P. M.
8 | Calm; artillery at night.
9 | Artillery duel in morning; Taubes in afternoon; violent artillery at night.
10 | Calm.
11 | Day calm; artillery at night.
12 | Taube 2 P. M.; artillery at night.
13 | A shell fell in a garden 10 A. M.; Taube 2 P. M.; night calm.
14 | Some artillery 4 P. M.
15 | Calm.
16 | Calm.
17 | Aerial battle 11 A. M.
18 | Calm; artillery at end of afternoon and at night.
19 | Bombardment 2 to 2:30 P. M., 200 shells, 1 killed.
20 | Day calm; bombs in evening, 3 killed, 5 wounded.
21 | Artillery in sector.
22 | Calm; artillery on front.
23 | Artillery morning and afternoon; aerial combat in afternoon.
24 | Calm.
25 | Day calm; short cannonade at midnight.
26 | Calm; artillery chiefly to north of Reims.
27 | Kaiser's birthday. Bombardment 11 A. M. to 2 P. M., 7 killed, 27 wounded.
28 | Calm; Taube 12:30 P. M.; French artillery to west of Reims.
29 | Bombardment 2 P. M., 50 shells; renewed 7 P. M.; Taube 3 P. M.
30 | Calm.
31 | Artillery on all Reims fronts; Taubes and aeros 10 A. M. to 2 P. M.

February, 1916

1 | Taubes; artillery duel to right and left.
2 | Bombardment from 2:30 P. M., 250 shells.
3 | Aeros; French artillery 1 P. M.
4 | Calm.
5 | Bombardment 3 to 4:30 P. M., 20 shells.
6 | 3 shells on a faubourg 10 A. M.
7 | French artillery; no response; artillery duel on front 9 P. M.
8 | Bombardment 11 to 11:30 A. M., 4 shells on faubourg; renewed 2 to 2:30 P. M., 50 shells, 1 wounded.
9 | Bombardment 5 P. M., 12 shells on faubourg; artillery duel 7 to 9 P. M.
10 | French artillery on left 9 A. M.
11 | Artillery in sector in morning.
12 | Violent bombardment 9:30 to 11:30 A. M., 110 shells, 1 killed; renewed in afternoon; French artillery on left at night.
13 | Bombardment in morning, 12 shells; renewed 12:15 P. M., 6 shells, 6 wounded.
14 | Bombardment on left 3:30 to 10 A. M.; renewed 10:30 A. M. to 12:30 P. M., more than 100 shells.
15 | Calm.
16 | Some shells on faubourgs.
17 | Cannonade 10 A. M.; some shells.
18 | Artillery in sector.
19 | Artillery in sector.
20 | Bombardment 2 to 3 P. M., 20 shells.
21 | Taube dropped 7 bombs 9:30 A. M., 2 killed, 5 wounded; 2 shells in afternoon; French artillery at night, no response.
22 | French artillery from 4 P. M.
23 | Day calm; 1 shell in evening.
24 | Taube dropped bomb 11 A. M.; French artillery 4 to 5 P. M.
25 | Violent cannonade and some bombs on extremities in afternoon.
26 | Bombardment 9 to 11:30 A. M., 40 shells, 2 killed, 1 wounded; renewed 2 to 4 P. M., 6 shells.
27 | Bombardment 11 A. M., 8 shells; renewed 3 to 5 P. M., 7 shells.

28

Bombardment 8 A. M., 12 shells; renewed 12:30 to 2:30 P. M., 32 shells; Taube 2 P. M.; renewed 4 to 5 P. M., 50 shells, 3 wounded.

29 | 10 shells on suburbs in morning; French artillery 6 P. M.

From "La Cathédrale de Reims," Libraire Centrale des Beaux-Arts, Paris.

THE WEST PORTALS

March, 1916

1 | Bombardment 9 A. M. to 2 P. M., 120 shells, 10 killed; renewed 8 to 9 P. M.
2 | Bombardment 10 A. M. to 2 P. M., 5 killed, 4 wounded; renewed 7 to 9:30 P. M., 50 shells, 2 wounded.
3 | French artillery 5 A. M.; bombardment 1:45 P. M.; renewed 6 to 8 P. M., 50 shells, 1 killed, 2 wounded.
4 | Bombardment 5 A. M.; renewed on faubourgs 5:30 P. M.
5 | Bombardment 11 A. M.; renewed 3 P. M.
6 | Aerial bomb 9 A. M.; some shells 11 A. M.; French artillery in afternoon.
7 | Aerial activity; no shells on Reims.
8 | Aerial activity and bombs, 2 wounded.
9 | Aerial activity and bombs; artillery on front in evening.
10 | Aerial activity.
11 | Aerial activity; French artillery 9 A. M., feeble response.
12 | Taube 9 A. M.; bombardment 5 to 6 P. M., 50 shells, several wounded.
13 | Aerial activity from 8 A. M.; bombardment 4 P. M.
14 | Aerial combat 10 A. M.; no shells on Reims.
15 | Calm; some shells on faubourgs.
16 | Aerial shell 5:15 A. M.; bombardment in morning, 15 shells; French artillery in evening.
17 | Bombardment 1:30 to 3:30 P. M.; renewed 4 to 6:30 P. M., 200 shells, some wounded.
18 | Artillery 2:30 and 5 A. M.; Taube 7 A. M.; aerial activity in morning; artillery duel in afternoon; cannonade 11 P. M.
19 | Artillery and aerial activity.
20 | Calm.
21 | Calm; short artillery action in morning.
22 | Feeble cannonade in morning; no shells on Reims.
23 | Calm; French artillery in sector 11 to 12 P. M.
24 | Calm.
25 | 2 aerial bombs 4 P. M.
26 | Calm.
27 | Heavy bombardment 9 to 11 A. M., 300 shells, 25 killed and wounded; renewed 2 P. M.
28 | Calm.
29 | Artillery on front from 1 A. M. to daybreak; day calm in Reims.
30 | Aeros; no shells.
31 | Aeros; Taubes and some shells.

April, 1916

1 | Some shells on faubourgs.
2 | Violent bombardment 9 A. M. to 5:30 P. M., 1500 shells, 5 killed, 41 wounded.
3 | Calm.
4 | Bombardment 5 to 6 P. M., 150 shells.
5 | Some shells; artillery at night.
6 | Day calm; French artillery at night.
7 | Day calm; artillery at night, 15 shells.
8 | French artillery in morning; 1 shell 8 P. M.
9 | French artillery; Taubes morning and afternoon; cannonade at night.

10

Taubes 9 A. M.; bombardment 11 A. M., 50 shells, 1 killed; renewed 4 to 4:30 P. M., 9 shells; again 10 to 11:30 P. M., 26 shells.

11 | Taube 6 A. M.; artillery afternoon and night.
12 | Bombardment 10 A. M., 2 victims; renewed 3 P. M.; artillery afternoon and night.
13 | Some shells 3 to 4 P. M.; artillery at night.
14 | Some shells 2 P. M.; artillery day and night.
15 | Bombardment 10 to 11:40 A. M.; renewed 2 to 5:30 P. M.; again 8:30 P. M.
16 | Taubes 6:30 and 9 A. M.; bombardment 11 to 11:30 A. M.; renewed 5:30 P. M.
17 | Bombardment in afternoon.
18 | No shells on Reims.
19 | Calm.
20 | Some shells 6:30 A. M.; aerial combat 5:30 P. M.
21 | Bombardment 11 A. M., 12 shells.
22 | Bombardment 3 P. M., 2 shells, 1 wounded; renewed 4:15 P. M., 4 shells; again 5 to 6 P. M.
23 | Easter Day. No shells.
24 | Taubes in morning; bombardment 2:30 to 7:30 P. M., 200 shells. 4 killed, 19 wounded.
25 | Calm.
26 | Bombardment 10:30 to 11:30 A. M., 30 shells.
27 | Anti-aerial fire in afternoon; 5 or 6 shells in evening; French artillery at night.

28

Bombardment 7 to 11 A. M., 16 shells; renewed 1:30 to 3:30 P. M., 28 shells; again 5 to 6 P. M., 15 shells; again 9 P. M., 9 shells.

29 | A few shells.
30 | Bombardment 3 to 5 P. M., 8 shells; renewed 5:15 to 6 P. M., 11 shells; again 9:30 P. M., 7 shells, 2 victims.

May, 1916

1 | Taube dropped bomb 5:30 A. M.; bombardment 11:45 A. M., 6 shells; renewed 6 to 8 P. M., 50 shells.
2 | Day calm; bombardment to south and north-west 8:30 P. M., 9 shells.
3 | Taube 6 A. M.; no shells on Reims; artillery at night.
4 | Taube 7:30 A. M. and 11:30 A. M.; bombardment 7 to 8 P. M., 37 shells, 1 wounded.
5 | Bombardment 10 to 11 A. M., 15 shells; renewed 4:30 P. M., 3 shells.
6 | Bombardment 8 to 10 A. M., 2 wounded; renewed 2:30 to 2:45 P. M., 4 shells; artillery at night.
7 | Bombardment 7 to 8 A. M., 2 shells; renewed 9 to 10 A. M., 23 shells.
8 | Bombardment 8 A. M.; renewed 3 to 6 P. M.; artillery at night.
9 | Bombardment 7:30 A. M., 5 shells; renewed from 9 A. M. to night, 300 shells; French artillery at night.
10 | Bombardment 7 to 9 P. M., more than 100 shells, 4 wounded; renewed 10 P. M.
11 | Bombardment 8 to 10 A. M.; renewed 1 to 2 P. M., 30 shells, 3 wounded.
12 | 1 shell in morning; bombardment of observation balloon, 5 to 6 P. M., 25 shells.
13 | 1 shell 9 A. M.
14 | Complete calm.
15 | Short bombardment 3 P. M.; some shells at night.
16 | Taube early morning; bombardment 11 A. M. to noon, 100 shells; renewed 5 to 7 P. M., 4 killed, 10 wounded.
17 | Aerial combat 8 A. M.; bombardment 12:30 to 2:30 P. M., 120 shells, 8 killed, 10 wounded; renewed 4 to 6 P. M.
18 | Bombardment 2 A. M.; 2 Taube bombs; renewed 9 to 11 A. M., more than 200 shells; French artillery at night.
19 | Bombardment in afternoon, 50 shells.
20 | Bombardment 2:15 to 2:30 P. M., 15 shells, 1 killed; renewed at midnight, 20 shells.

21

Bombardment 12:30 A. M., 1 shell; renewed 11 A. M. to noon, 20 shells; again 2 to 3 P. M., 32 shells; again 5 P. M., 6 shells.

22

Bombardment 3 A. M.; Taube 6 A. M.; bombardment renewed 2 to 3 P. M., 32 shells; again 5:30 P. M., 6 shells; artillery at night.

23 | Day calm; bombardment 9:30 P. M., 12 shells, 2 killed.
24 | Bombardment 1:30 to 5 P. M., 1 killed, 11 wounded.
25 | Intermittent bombardment from 1:30 P. M.
26 | Bombardment in afternoon.
27 | Some shells in afternoon.
28 | Bombardment 9 A. M.; renewed 2 P. M.
29 | Artillery duel; some shells in morning.
30 | Calm.
31 | Day calm; some shells 8:30 and 11:30 P. M.

June, 1916

1

Taube at dawn; bombardment 6:30 to 9 A. M., 5 shells; renewed 10 to 11 A. M., 8 shells; again 3:30 to 4 P. M., 15 shells; again 10 P. M., 3 shells, 1 wounded.

2 | Bombardment 6 to 7:30 A. M., 25 shells; renewed 11 A. M.; again 3 P. M.
3 | Bombardment 6 to 7 P. M., 100 shells; renewed 9 to 10 P. M., 11 shells.
4 | Bombardment 8:30 to 9 P. M.
5 | Bombardment 9:30 A. M., 7 shells; renewed 3 P. M., 5 shells.
6 | Bombardment 9 to 10 A. M., 20 shells; renewed 5 P. M., 3 shells.
7 | Bombardment 9 to 10 A. M., 12 shells; renewed at noon, 3 shells; again 8 P. M., 4 shells on vacant land.
8 | 1 shell 9 A. M.; 1 shell 5 P. M.
9 | Bombardment 8 to 9 A. M.; renewed in afternoon, 8 shells; again 10 P. M.
10 | Bombardment 7:30 to 9 A. M., 6 shells.
11 | Bombardment 9 to 10 A. M.
12 | Calm.
13 | 1 shell; artillery on front.
14 | Some shells in afternoon.
15 | Calm.
16 | Calm.
17 | Taube 5 A. M.; bombardment 8:43 to 11 A. M., 7 shells; renewed 1 to 1:30 P. M., 3 shells; French artillery 4 P. M.
18 | No shells.
19 | Bombardment 9 to 11 A. M. on faubourgs; aerial combat in afternoon, 4 shells fell into Reims.
20 | Aerial fire 6:30 P. M.; artillery on front at night.
21 | Anti-aerial shell fell back 6:15 A. M.
22 | Artillery on front; bombardment 3 to 4 P. M., 24 shells; aerial shell fell back 6:30 P. M.
23 | Bombardment 9:30 to 10 P. M., 41 shells.
24 | Bombardment 3:30 to 5 P. M., 50 shells.
25 | French artillery 4 P. M., no response.
26 | Calm.
27 | French artillery, no response.
28 | Bombardment 2 to 2:30 P. M., 5 shells; French artillery at night.

29

Bombardment 9:30 to 11:15 A. M., 45 shells; renewed 12 to 1:30 P. M., 18 shells, 1 killed; again 3:30 to 5 P. M., 34 shells.

30

Bombardment 9:30 to 10 A. M., 10 shells; renewed 2:20 to 2:45 P. M., 15 shells, 1 killed, 2 wounded; again 4 to 5 P. M., 6 shells, 3 killed, 2 wounded; French artillery at night.

July, 1916

1 | Taubes in morning; bombardment 5 to 6 P. M., 12 shells; artillery at night.
2 | Bombardment 5 to 8 P. M., 356 shells.
3 | 3 Taube bombs 4:30 A. M.; somewhat tranquil.
4 | Nothing to note.
5 | Some shells 4:30 P. M.; artillery on front.
6 | Taube 6:30 A. M.
7 | Complete calm.
8 | Complete calm.
9 | Complete calm.
10 | Taube 10 A. M.; 1 bomb 2 P. M.; French artillery at night.

11

Bombardment 10 A. M., 4 shells; renewed 5:45 to 7 P. M., 96 shells; again 9 P. M., 50 shells, 5 killed, 6 wounded; French artillery at night.

12 | Some German prisoners passed through Reims.
13 | Calm.
14 | Calm.
15 | Calm.
16 | Calm; French fire on German trenches in afternoon, no response.
17 | Calm.
18 | Calm; artillery duel at night.
19 | 2 Taube bombs on fields.
20 | French aeros over German lines 3 A. M.
21 | Artillery duel 4 P. M.
22 | Taube 6 A. M.; French artillery 10 P. M.
23 | Calm.
24 | Taube 4:30 A. M.
25 | Taube 6 P. M.; French artillery at night, no response.
26 | Day calm; Taube 5 P. M.; French artillery and some shells at night.
27 | Taube 6 A. M.; bombardment 3:30 P. M., 13 shells.
28 | Bombardment 5 P. M., 3 shells; 20 shells later.
29 | Some artillery in afternoon; French aeros over German lines.
30 | Calm.
31 | 1 shell 6 A. M.; Taube 8 A. M.

August, 1916

1 | Bombardment 5 to 6 A. M., 55 shells; renewed 6 to 7 P. M., 54 shells; French artillery 10 P. M. to 1 A. M.
2 | French artillery to 1 A. M.; shells early morning; artillery on front 10 P. M. to 2 A. M.
3 | Artillery on front to 2 A. M.; bombardment 4:30 to 5:15 P. M., 5 shells; 1 shell at night.
4 | Bombardment 4:30 to 5:30 P. M., 3 shells; artillery at night.
5 | Bombardment 1 to 2 P. M., 3 shells; renewed 5 to 6:30 P. M., 34 shells; again 10 P. M.
6 | Taube early; intermittent bombardment; more serious 4:15 to 7 P. M.; French artillery 11:15 P. M., no response.
7 | Day calm; bombardment 7:30 to 8 P. M., 3 shells; French artillery at night.
8 | Some shells 6 P. M.
9 | Taube early; bombardment 11 to 11:30 A. M., 5 shells; renewed 6 P. M.
10 | Bombardment 5:30 P. M., 2 shells; renewed 6:15 P. M., 2 shells; again 8 to 9 P. M., 50 shells.
11 | Day calm; French artillery at end of afternoon.

12

Bombardment 5:30 P. M., 14 shells, 1 killed, 2 wounded; renewed 7 to 8 P. M., 25 shells; French artillery at night, no response.

13 | 7 Taubes dropped 19 bombs, 7 P. M., 21 victims. Civil Hospital burned; St. Remi menaced; 21 shells from bombardment.
14 | Calm; French artillery at night.
15 | 4 shells in evacuated zone; bombardment 10 to 11:30 P. M.
16 | Calm.
17 | Day calm; 8 shells at night.
18 | Calm; Taube 9 P. M.
19 | Calm.
20 | Calm.
21 | Calm.
22 | Calm.
23 | Bombardment 10:45 to 11:15 A. M., 20 shells.
24 | Taube 8 A. M.; bombardment 12:15 P. M.; aerial combat 1 P. M., 2 bombs dropped.
25 | Bombardment 11 to 11:15 A. M., shells on faubourgs.
26 | Bombardment 5 to 5:15 P. M., 7 shells; again 9 P. M., 4 shells.
27 | Bombardment 8:30 A. M., 12 shells; renewed 11:30 A. M. to 1:15 P. M., 26 shells.
28 | Bombardment 10 to 10:15 A. M., 12 shells, 1 wounded; renewed 5 to 6:30 P. M., 28 shells.
29 | Bombardment 8 to 9:30 A. M., 13 shells, 2 wounded.
30 | Calm.
31 | Bombardment 10 A. M. to noon, 36 shells.

September, 1916

1 | Calm.
2 | Calm; 2 Taubes 5 P. M.
3 | Taube; bombardment 8:30 to 10:30 A. M., 13 shells; renewed 5 to 7 P. M.
4 | Calm.
5 | Bombardment 10:30 A. M., 3 shells.
6 | No shells.
7 | No shells.
8 | No shells.
9 | Some shells in morning, 1 wounded; Taube dropped 2 bombs 6 P. M., 1 killed, 1 wounded; artillery to south at night.
10 | Calm.
11 | French artillery in morning; no shells.
12 | Calm.
13 | Calm.
14 | Calm.
15 | 20 Taube bombs 12:15 P. M., 2 killed, 1 wounded; intermittent French artillery at night.
16 | Calm.
17 | Taubes in morning; no shells; French artillery to south in afternoon; Taube 6 P. M.
18 | Calm.
19 | Anniversary of cathedral fire in 1914; calm; Taube in afternoon; French artillery at night.
20 | Calm.
21 | French artillery 11 A. M., no response.
22 | Bombardment 9:30 A. M. to noon, 32 shells, 1 killed, 6 wounded.
23 | Taube 8 A. M.; bombardment 9:30 to 11 A. M., 33 shells.
24 | Taube 8 A. M.; bombardment 11 A. M., 32 shells; renewed 1:30 P. M., 10 shells on observation balloon in rear of Reims.
25 | German fire on aeros; bombardment 1:30 to 4 P. M., 21 shells.
26 | Bombardment 3:30 to 5 P. M.; renewed 5:30 to 6:30 P. M.; 19 shells in all.
27 | Bombardment 1:30 to 3:30 P. M., 31 shells.
28 | Bombardment 10:30 A. M.; no shells on Reims.
29 | Very calm; no cannon sounds in sector.
30 | Calm.

October, 1916

1 | Bombardment 1 P. M., 3 shells; renewed 1:15 P. M., 13 shells.
2 | Calm; some cannonade in morning.
3 | Nothing to note.
4 | Taube 6 A. M.; bombardment 10 to 11 A. M., 9 shells; renewed 4 to 5:45 P. M., 40 shells.
5 | Bombardment 12 to 12:30 P. M., 7 shells; renewed 4 P. M., Taube shrapnel, 1 wounded.
6 | Taube 10 A. M.
7 | Nothing to note.
8 | Calm.
9 | Calm.
10 | Taube in morning; bombardment 3:30 to 6 P. M., 28 shells.
11 | 4 Taubes 6 to 11 A. M., dropped 4 shells; artillery 5 P. M.
12 | Calm.
13 | Bombardment 8 A. M., 4 shells.
14 | Distant bombardment 11 A. M.; some shells.
15 | Calm.
16 | Bombardment 2 P. M.
17 | Bombardment 8 A. M., 10 shells.
18 | No shells; French artillery 4 P. M.
19 | Calm.
20 | Bombardment 10 to 11 A. M., 18 shells; renewed 3 to 5 P. M., 13 shells.
21 | Bombardment 9:30 to 11:30 A. M., 19 shells; 8 shells in afternoon.
22 | Fire on Taubes.
23 | Fire on Taubes 7 A. M.; some shells in the day.
24 | Fire on Taubes.
25 | Bombardment 10:30 A. M., 11 shells; renewed 1:30 to 5 P. M., 400 to 500 shells; French artillery from 9 P. M.
26 | Relatively calm.
27 | Heavy bombardment 6:45 A. M. to 5 P. M., about 1200 shells.
28 | Bombardment 3 to 5 P. M., 13 shells.
29 | Calm.
30 | French artillery in morning, no response.
31 | Some shells in morning.

November, 1916

1 | Bombardment 2:45 to 3:45 P. M., 7 shells; renewed 4 to 5 P. M., 12 shells.
2 | Calm.
3 | Morning calm; anti-aerial fire in afternoon.
4 | French artillery 8 A. M.; bombardment 9:45 to 11 A. M., 28 shells; violently renewed 2 to 4:30 P. M., 600 shells.
5 | Artillery in sector.
6 | Bombardment 3:10 to 5:30 P. M., 100 shells.
7 | Bombardment 6:30 to 7:30 A. M., 36 shells; renewed 11 to 11:30 A. M., 67 shells.
8 | Bombardment 7:30 P. M., 6 shells.
9 | Nothing to note.
10 | Aviation 10 A. M.; French artillery in afternoon.
11 | Taube 11 A. M.; French artillery in afternoon.
12 | Nothing to note.
13 | Nothing to note.
14 | Bombardment 11 to 11:30 A. M., 12 shells; renewed 12:30 to 1 P. M., 12 shells; French artillery 8:30 to 10 P. M.
15 | Taube; bombardment 2 to 4 P. M., 14 shells; renewed 5 to 6:30 P. M., 12 shells; again 7 P. M.
16 | Taube; light bombardment 11 A. M.; renewed 5 to 6:15 P. M., 12 shells.
17 | Bombardment 3 P. M., 12 shells.
18 | Calm.
19 | Bombardment 3:30 to 4 P. M., 7 shells.
20 | Nothing to note.
21 | Nothing to note.
22 | Nothing to note.
23 | Nothing to note.
24 | Aerial activity.
25 | Nothing to note.
26 | Nothing to note.
27 | Nothing to note.
28 | Nothing to note.
29 | Bombardment of fields near Reims 10 A. M.
30 | Short artillery duel in morning.

December, 1916

1 | Calm.
2 | 4 shells in morning.
3 | Nothing to note.
4 | Nothing to note.
5 | Nothing to note.
6 | Calm.
7 | Complete calm.
8 | Complete calm.
9 | Some shells morning and afternoon.
10 | Bombardment 1 to 2 P. M., 15 shells.
11 | Bombardment morning and afternoon.
12 | Complete calm.
13 | Bombardment 9 to 9:45 A. M.; renewed 1 to 2 P. M.; 9 shells.
14 | Bombardment 1 to 4 P. M., 32 shells.
15 | Bombardment 10 A. M. to 12:30 P. M., 36 shells.
16 | Nothing to note.
17 | Nothing to note.
18 | Bombardment at intervals.
19 | Bombardment in afternoon to 11:30 P. M., 39 shells.
20 | Some shells in afternoon.
21 | Calm.
22 | Calm.
23 | Calm.
24 | Cannonade in afternoon.
25 | Christmas Day; nothing to note.
26 | Artillery in afternoon.
27 | Bombardment 8:30 to 11:30 A. M., 50 shells; renewed 5:30 to 8 P. M., 6 shells.
28 | Calm.
29 | Calm.
30 | Violent cannonade in sector all day and greater part of night; no shells on Reims.
31 | No shells.

1917

January, 1917

1 | Day calm; 1 shell at night.
2 | Bombardment 1 to 3 P. M., 19 shells.
3 | Bombardment 11 A. M., 2 shells; artillery at night.
4 | Some shells.
5 | Some shells.
6 | Calm.
7 | Calm.
8 | Nothing to note.
9 | Bombardment 5 to 5:30 P. M., 16 shells.
10 | Almost complete silence.
11 | Nothing to note.
12 | Calm.
13 | Calm.
14 | Bombardment 12:15 to 1 P. M., 12 shells; heavy cannonade on front to next morning.
15 | Intermittent artillery in day; more active at night.
16 | Some artillery; continued in night.
17 | Nothing to note.
18 | Nothing to note.
19 | Nothing to note.
20 | Nothing to note.
21 | Bombardment 12:30 to 3 P. M., 15 shells; renewed 3 to 4 P. M., 24 shells.
22 | Bombardment 5:30 to 6 P. M., 8 shells.

23

Bombardment 7 A. M., 1 shell; renewed 10:30 to 11:45 A. M., 10 shells; again 4:30 P. M., 1 shell; again 5 to 6:30 P. M., 10 shells.

24

Bombardment 9 A. M. to noon, 26 shells; renewed 12:30 to 2 P. M., 19 shells; again 2 to 4:30 P. M., 13 shells; again 7 to 8 P. M., 14 shells.

25 | Various bombardments in day; 10 shells, 5 to 6 P. M.
26 | Relatively calm; some shells.
27 | Kaiser's birthday. Bombardment 11 A. M. to 5 P. M., 77 shells; renewed 9 P. M.
28 | Bombardment 12 to 5 P. M., 24 shells; renewed 9 to 9:45 P. M., 10 shells.
29 | Bombardment 10:30 A. M. to 12:30 P. M., 4 shells; renewed 3 to 4 P. M., 4 shells; again 10 P. M. to 3 A. M.
30 | Bombardment continued to 3 A. M.; intermittent bombardment in afternoon.
31 | Bombardment 4 to 6 P. M., 82 shells.

February, 1917

1 | Nothing to note.
2 | Absolute calm.
3 | Nothing to note.
4 | Nothing to note.
5 | Some shells at end of day.
6 | Intermittent bombardment all day; 16 shells 4:30 to 5:30 P. M.
7 | Bombardment 10 to 11 A. M., 14 shells; renewed 3 to 5 P. M., 12 shells.
8 | Bombardment 4 P. M., 13 shells; renewed 8 to 8:30 P. M., 16 shells.
9 | Bombardment 9:30 A. M.; renewed 1 to 5 P. M., 57 shells.
10 | Nothing to note.
11 | Bombardment 4:30 to 5 P. M., 2 shells.
12 | Bombardment 3:15 to 3:45 P. M., 5 shells.
13 | Bombardment 11:30 A. M. to 3:30 A. M., 117 shells.
14 | Bombardment continued to 3:30 A. M.; day calm; renewed 9:30 P. M.

15

Bombardment 10 A. M. to noon, 8 shells; renewed 12 to 3 P. M., 8 shells; again 5 to 6 P. M., 64 shells; again 8 P. M., 1 shell.

16 | Nothing to note.
17 | Nothing to note.
18 | Some shells in early morning.
19 | Calm.
20 | Calm.
21 | Calm.
22 | 1 shell in afternoon.
23 | Nothing to note.
24 | Bombardment 7:30 to 10 P. M., 13 shells; renewed 10:30 P. M. to 2 A. M., 25 shells.
25 | Bombardment continued to 2 A. M.; renewed at noon, 3 or 4 shells; again 9 P. M., 3 shells.
26 | Bombardment 5:30 P. M., 3 shells; renewed 9:30 P. M. to 5:30 A. M., 20 shells.
27 | Bombardment continued to 5:30 A. M.; renewed 9 A. M., 5 shells; distant artillery afternoon and night.
28 | Bombardment 3 A. M., 5 shells; renewed 5:30 P. M., 5 shells; 3 shells in night.

March, 1917

1 | Bombardment 1:30 to 4:30 P. M., 20 shells.
2 | Relatively calm; some distant shells.
3 | Bombardment 3:30 P. M., 2 shells and distant projectiles.
4 | Bombardment 5 to 6:30 P. M., 18 shells.
5 | Bombardment 4:30 to 6 A. M., 6 shells; renewed 11:30 A. M., 1 shell.
6 | Bombardment 11:30 A. M., 4 shells; renewed 3:45 P. M., 1 shell; again 8:30 P. M., 1 shell.
7 | Day relatively calm; some shells at night.
8 | Distant shells 12:30 P. M.
9 | Distant artillery.
10 | Some distant shells at night.
11 | Bombardment 11:30 A. M., 2 shells; renewed 2:30 P. M., 2 shells; distant artillery at night.
12 | Bombardment 10:30 to 11:30 A. M., 15 shells; agitated night.
13 | Bombardment 1 to 7:30 A. M., 200 shells; renewed 5 to 6 P. M., 20 shells.
14 | Bombardment 9 to 10 A. M., 12 shells; renewed 1:15 to 2 P. M., 19 shells; again 6 P. M., 5 shells.
15 | Bombardment 12 to 3 P. M.; renewed 5:30 to 7 P. M., 50 shells.
16 | Bombardment in morning; renewed 1 P. M., 12 shells; again 4:30 P. M., 20 shells; again 6 P. M., 12 shells.
17 | Bombardment 4:30 to 5:30 A. M., 541 shells; renewed 1 P. M., 3 shells; agitated night.
18 | Bombardment 8:10 A. M., 12 shells; renewed 10:30 A. M., 9 shells; occasional shells in afternoon and evening.
19 | Bombardment 9 to 10 A. M., 180 shells; renewed 6 P. M., 27 shells.
20 | Distant shells all morning; bombardment 2:10 to 5:45 P. M., 41 shells; renewed 7 P. M. to 5 A. M., 120 shells.
21 | Bombardment continued to 5 A. M.; renewed 10 to 11 A. M., 18 shells; renewed 2:30 P. M., 4 shells.
22 | Bombardment 12:30 P. M., 4 shells; boisterous night.
23 | Bombardment 10 A. M. to 2 P. M., 82 shells; boisterous night.
24 | Bombardment 9 A. M. to noon, 234 shells; 12 shells in afternoon.
25 | Bombardment 8 A. M. to 2 P. M., 453 shells; renewed 2:30 P. M., 26 shells.
26 | Bombardment 1:30 A. M., 39 shells; some shells in afternoon.
27 | Bombardment 3 to 4 A. M.; renewed 8 A. M. to noon and at night.
28 | Bombardment 10 A. M. to noon, 401 shells; renewed 2 to 5:30 P. M., 181 shells.

29

Bombardment 1:45 to 2 P. M., 9 shells; renewed 4:45 to 5:15 P. M., 4 shells; again 5:40 P. M., 2 shells; again 8 to 9 P. M., 37 shells.

30

Bombardment 12:30 A. M., 2 shells; renewed 2 A. M., 8 shells; again 9 A. M. to 1:50 P. M., 56 shells; again 3 to 6 P. M., 160 shells.

31

Bombardment from midnight to 5:30 A. M., 29 shells; renewed 8:30 to 10:30 A. M., 45 shells; again 3 to 6 P. M., 32 shells; again 7 to 7:30 P. M., 6 shells.

April, 1917

1 | Bombardment 4:30 to 5:30 A. M., 684 shells; renewed from 9 A. M., 2048 shells; total for the day, 2732 shells.
2 | Bombardment from 8 A. M., 2259 shells; some shells at night.
3 | Bombardment 9 A. M. to 8:30 P. M., 1744 shells.
4 | Bombardment all day, particularly violent 4:30 to 8 P. M., 2123 shells; some shells 9 P. M.
5 | Bombardment in morning, 10 shells; renewed in afternoon to 5:30 A. M., 795 shells.
6 | Bombardment continued to 5:30 A. M.; renewed 4 to 8 P. M., and again in night.
7 | Bombardment to 8 P. M., 8785 shells for April 6 and 7. Grand Séminaire burned 4 P. M.
8 | Easter Day. Bombardment 2:30 to 9 P. M., particularly violent 5:30 P. M.

9

Bombardment from 4:30 A. M.; particularly violent 2 to 4 P. M. and at 7 P. M.; continued during part of the night; evacuation of civil population ordered.

10 | Bombardment in afternoon; particularly violent 4 to 9 P. M.; continued in night.
11 | Bombardment day and night.
12 | Bombardment day and night, particularly at 9 P. M.; perhaps 7000 or 8000 shells.
13 | Bombardment diminished 7 A. M.; renewed for the day, 10 A. M.
14 | Bombardment day and night, particularly from 5 P. M. to 5 A. M.
15 | Bombardment day and night; St. André burned 4:30 P. M.; 15 shells on the cathedral.
16 | Bombardment 2:30 to 5 P. M.
17 | Bombardment day and night.
18 | Bombardment 12:30 to 3 P. M.; French artillery from 4:30 P. M.; 80 fires in Reims from April 7 to April 18.

19

Bombardment from midnight to 3 A. M.; renewed 10:30 A. M. to 7:30 P. M., 25 shells on cathedral, north tower, vaults and transept injured; renewed 10 P. M. to 5 A. M., 600 shells. Cardinal Luçon issued protest against bombardment.

20

Bombardment continued to 5 A. M.; renewed 10 to 11 A. M., 50 shells; again 12 to 8:30 P. M., 300 shells, particularly violent 6 P. M.; 2 shells on cathedral.

21

Bombardment 3 to 6 A. M.; renewed 10:30 A. M.; again 1 P. M., Hôtel de Ville gravely injured; again 2:30 P. M.; again 6 to 8 P. M.; artillery at night. Cathedral injured, 8 shells.

22 | Bombardment 9 A. M. to noon, 100 shells; renewed 2 to 6 P. M., 600 shells; cathedral injured, 3 shells; agitated night.
23 | Bombardment 7:30 A. M. to 3 P. M.; renewed 6:30 P. M.; night calm; cathedral injured.

24

Cannonade from 4 A. M.; bombardment from 7:30 A. M., furious from 9 A. M. to 3 P. M., cathedral injured; few night shells.

25 | Bombardment 9:30 A. M. to 7 P. M.; disturbed night.
26 | Bombardment 1 A. M.; renewed 7:30 A. M. to 4 P. M.; again 7 P. M.; night calm.
27 | Bombardment from 7:30 A. M.
28 | Bombardment continued, particularly violent 12 to 3 P. M. and 7 to 8:20 P. M.; St. Thomas and St. André injured.
29 | Bombardment all day.
30 | Bombardment continued; perhaps 1200 shells.

L'Illustration

THE CATHEDRAL AFTER THE BOMBARDMENTS OF APRIL, 1917

THE APSE AND SOUTH TRANSEPT

May, 1917

1 | Bombardment continued, 1200 shells.
2 | Bombardment violently continued, 600 shells.
3 | Bombardment continued day and most of night; Hôtel de Ville took fire 2 P. M.; library lost.
4 | Bombardment continued day and night; Hôtel de Ville still burning.
5 | Bombardment continued; furious at night.
6 | Bombardment continued day and night.
7 | Bombardment continued; night less agitated.

8

Bombardment from 9 A. M.; centre of Reims violently bombarded 11:30 A. M.; some shells in afternoon; renewed 10 to 11 P. M.

9 | Bombardment 9 A. M.; renewed 10 P. M.; perhaps 900 shells.
10 | Bombardment from 10 A. M.; redoubled 1 to 7:30 P. M.; renewed 9 P. M. for the night.
11 | Bombardment continued to 11:30 A. M.; renewed at noon; considerably diminished 2 P. M.; renewed 4:30 P. M.
12 | Bombardment continued day and night.
13 | Bombardment continued day and night; 15,000 shells, estimated, since May 11.
14 | Bombardment 9 A. M. to 2 P. M.; renewed in night.
15 | Bombardment continued afternoon and part of night, with less intensity.
16 | Bombardment continued, less intense.
17 | Bombardment continued.
18 | Bombardment 11:55 A. M.; renewed 2 to 3 P. M.; continued in night; 500 shells in day.
19 | Bombardment continued; 3000 to 4000 shells estimated for day and night.
20 | Bombardment day and night, about 500 shells.
21 | Bombardment continued day and night, 1000 shells.
22 | Bombardment continued with less intensity, about 200 shells.
23 | Bombardment continued day and night, 500 shells.
24 | Morning calm; bombardment in afternoon, 200 shells.
25 | Bombardment continued; 500 shells.
26 | Relatively calm; bombardment 2 P. M., 200 shells.
27 | Bombardment from 5 A. M., more than 1000 shells; asphyxiating shells 6 to 8 A. M.; night relatively calm.
28 | Bombardment from 6 A. M.; perhaps 2000 shells.
29 | Bombardment from 4 A. M., day and night.
30 | Bombardment continued in day, 300 shells; night calm.
31 | 1 shell 1 A. M.; bombardment from 6 A. M., day and night, 200 shells.

June, 1917

1 | Taube dropped 2 bombs 12:30 A. M.; bombardment continued, 500 shells; night calm.
2 | Bombardment from 7 A. M., 500 shells.
3 | Bombardment from 6:30 A. M., day and night, more than 1000 shells.
4 | Bombardment from 7 A. M., 300 shells.
5 | Bombardment from 7 A. M., 200 shells.
6 | Bombardment from 6:30 A. M., 1500 shells; St. Benoît injured.
7 | Bombardment from 5:30 A. M., 200 shells; night calm.
8 | Bombardment continued, 400 shells.
9 | Bombardment day and night, 500 shells.
10 | Bombardment from 4 P. M.
11 | Bombardment afternoon and night, 500 to 600 shells.
12 | Bombardment from 6 A. M., 1200 shells.
13 | Bombardment from 5 A. M., 400 to 500 shells.
14 | Bombardment from 6 A. M., 500 shells.
15 | Bombardment from 5 A. M.
16 | Bombardment from 5 A. M.; violent 9 A. M. to 2 P. M., 500 shells; continued at night; 1500 shells in all.
17 | Bombardment from 7:30 A. M., day and night, 2500 shells.

18

President Poincaré visited Reims; gave decoration of Legion of Honour to Cardinal Luçon, Archbishop of Reims; MM. de Bruignac and Émile Charbonneaux, adjuncts to the Mayor of Reims; Dr. Harman of the hospital service; M. Beauvais, director of the School of Commerce and Industry; M. Martin, secretary-in-chief to the Sous-Préfecture, and M. Paul Dramas, editor-in-chief of "L'Eclaireur de l'Est." Bombardment from 5 A. M. and at night, 500 to 600 shells.

19 | Bombardment all day, 3000 shells.
20 | Bombardment from 6 A. M., day and night, 500 to 600 shells.
21 | Morning calm; bombardment 4 to 7 P. M., 450 shells; renewed at night.
22 | Bombardment most of the day; renewed 10 P. M. to 4 A. M., 850 shells.

23

Bombardment continued to 4 A. M.; renewed 6 A. M., more than 1300 shells (800 from 9 A. M. to 1 P. M.; 205 from 1 to 3 P. M.; 255 from 3 to 7 P. M.; more than 50 at night).

24 | Bombardment continued, 717 shells.
25 | Bombardment continued; terrible in the afternoon and night, 2442 shells.
26 | Bombardment day and night, less intense, 617 shells.
27 | Bombardment continued day and night.
28 | Bombardment continued; 8 shells on the cathedral.
29 | Bombardment continued day and night, 772 shells.
30 | Day relatively calm; intense bombardment at night, 200 shells.

July, 1917

1 | Bombardment continued, 200 shells.
2 | Bombardment continued, more than 600 shells.

3

Bombardment continued, 1200 shells (120 from 9 A. M. to 1 P. M.; 400 from 2 to 5 P. M.; 20 from 7 to 8 P. M.; 600 from 9 P. M. to 2 A. M.).

4 | Bombardment continued, 300 shells.
5 | Bombardment continued, 800 shells (100 from 12 to 2 P. M.; 700 from 2 to 8:30 P. M.; 3 in the night).
6 | Bombardment continued, 600 shells (350 from 6 A. M. to 2 P. M.; 50 from 3 to 4 P. M.; 200 after 4 P. M.).

7

Bombardment continued, 350 shells (250 from 4 to 9 A. M.; 15 from 9 to 10 A. M.; 1 at 6:45 P. M.; 100 from 11 P. M. to midnight).

8 | Bombardment continued; 12 shells at 9 A. M.; 14 shells at 2 P. M.

9

Bombardment continued; 20 shells 2 to 5 A. M.; 90 at 8 A. M.; 25 from 9 A. M. to noon; 40 from 2 to 3 P. M.; 2 at 8 P. M.

10 | Bombardment continued; 20 shells 4 to 5 P. M.; 60 at 8 P. M.; 55 in the night.
11 | Bombardment continued; 61 shells 9 to 11 A. M.; 12 at 7 P. M.
12 | Bombardment continued, 1350 shells (30 from 7 to 10 A. M.; 1260 from 8 to 10 P. M.; 60 from 10 P. M. to 2 A. M.).

13

Bombardment continued, 2000 shells (250 from 7:30 to 11 A. M.; more than 300 in the afternoon; 900 from 5 to 10 P. M.; more than 500 in the night).

14 | Bombardment continued, 2500 to 3000 shells (1650 from 5 A. M. to 1 P. M.; 700 from 2 to 10 P. M.; 13 in the night).
15 | Bombardment continued, 800 shells (50 from 11 A. M. to noon; 700 from 12 to 1 P. M.; 50 in the night).

16

Bombardment continued, 2537 shells (50 at 6 A. M.; 250 from 8 A. M. to 1 P. M.; 1231 from 2 to 7 P. M.; 30 from 8 to 10 P. M.).

17 | Bombardment continued, but day relatively calm, 129 shells (4 at 11 A. M.; 125 at 7 P. M.).
18 | Bombardment continued, 840 shells (160 at 7 P. M.; 580 from 9 P. M. to 2 A. M.).
19 | Bombardment continued, 80 shells.
20 | Bombardment continued, 119 shells.

21

Bombardment continued, more than 900 shells (30 from 7 to 8 A. M.; 30 from 8:30 to 11 A. M.; 760 from 1 to 3 P. M.; 100 from 11 P. M.).

22

Bombardment continued, 828 shells (50 from 8 to 9 A. M.; 122 from 9 to 10:30 A. M.; 6 from 12 to 4 P. M.; 650 after 4 P. M.).

23 | Bombardment continued, 1340 shells (400 from 8 A. M. to 1 P. M.; 650 from 2 to 4 P. M.; 290 after 9 P. M.).
24 | Bombardment continued, 140 shells (40 at 10 A. M.; 65 at 3 P. M.; 35 at 9:30 P. M.).
25 | Bombardment continued, 420 shells (200 from 6 to 11 A. M.; 220 at 9:30 P. M.).
26 | Bombardment continued to 3 A. M., 443 shells; 286 shells in the day (6 at 6 P. M., 280 at 10 P. M.).

27

Bombardment continued, 1201 shells (160 from 8 A. M. to noon; 120 from 4 to 5 P. M.; 100 at 8 P. M.; 821 after 11 P. M.).

28 | Bombardment continued, 627 shells (200 from 9 to 11 A. M.; 100 from 7 to 8 P. M.; 327 after 10 P. M.).

29

Bombardment continued, 513 shells (25 from 9 to 10:30 A. M.; 100 at 2 P. M.; 50 from 4 to 6 P. M.; 300 from 9 to 10 P. M.; 30 in the night). M. Martin, decorated by the President on June 18, killed by a shell at the temporary Sous-Préfecture near Reims.

30 | Bombardment continued, more than 1300 shells (695 from 3 to 4 P. M.; 590 from 5:30 to 7 P. M.; 20 from 9 to 10 P. M.).
31 | Bombardment from 3 to 4 P. M., 20 shells.

August, 1917

1 | Bombardment continued.
2 | Bombardment continued, 35 shells in the day; 405 after 9 P. M.
3 | No shells in the day, 13 shells between 10 and 10:45 P. M.
4 | Bombardment continued, 51 shells (5 from 1:45 to 2:30 P. M.; 40 from 4 to 6 P. M.; 6 from 6:30 to 7 P. M.).
5 | Bombardment continued, 58 shells (40 from 5 to 6 P. M.; 11 from 6 to 7 P. M.; 7 from 9 to 10 P. M.).
6 | Bombardment continued, 26 shells (16 from 12 to 1 P. M.; 10 from 4 to 5 P. M.).
7 | Bombardment continued.
8 | Bombardment continued, 141 shells (29 from 10 to 11 A. M.; 20 from 4 to 4:30 P. M.; 92 from 6 to 7 P. M.).
9 | Bombardment continued, 140 shells (50 from 9 to 11 A. M.; 90 from 10 to 11 P. M.).

10

Bombardment continued, 126 shells (6 from 3 to 3:30 P. M.; 48 from 3:30 to 4:30 P. M.; 14 from 6 to 7 P. M.; 58 from 11 P. M. to midnight).

11

Bombardment continued, 600 to 660 shells (60 from 3 to 5 A. M.; 50 from 9:30 to 10:30 A. M.; more than 500 from 3 to 9 P. M.).

12

Bombardment continued, more than 400 shells (15 at 7:30 A. M.; 30 at 9 A. M.; 159 at 5 P. M.; 132 from 6 to 7 P. M.; 79 in the night).

13 | Bombardment continued, 1,680 shells.
14 | Bombardment continued, 200 shells.
15 | Bombardment continued, 55 shells (27 from 3 to 3:30 P. M.; 28 from 9 to 11 P. M.).
16 | Bombardment continued, 173 shells (25 from 3:30 to 6 P. M.; 140 from 6 to 8 P. M.; 8 from 8:45 to 9 P. M.).

17

Bombardment continued, 378 shells (39 from 6:30 to 8:30 A. M.; 10 from 10 to 10:30 A. M.; 30 from 2 to 2:30 P. M.; 299 from 5 to 11 P. M.).

18 | Bombardment continued, 128 shells (108 from 12 to 4 P. M.; 20 from 6 to 8 P. M.).
19 | Bombardment continued, 588 shells (392 from midnight to 2 A. M.; 52 from 4 to 9 A. M.; 144 from 7 to 10 P. M.).
20 | Bombardment continued, 563 shells (28 from 12:30 to 1:30 P. M.; 514 from 3 to 6 P. M.; 20 from 9 P. M. to midnight).
21 | Bombardment continued, 150 shells (2 at 8 A. M.; 63 at 12:30 P. M.; 40 in the afternoon; 45 after 8:45 P. M.).
22 | Bombardment continued, 140 shells (30 from 10:30 to 11:30 A. M.; 100 from 12:30 to 2 P. M.; 10 at 5:30 P. M.).
23 | Bombardment continued, 103 shells (3 at 4 A. M.; 15 at 10 A. M.; 50 from 3 to 4 P. M.; 35 in the night).
24 | Bombardment continued, 30 shells, from 9 P. M. to midnight.
25 | Bombardment continued, 153 shells (6 from 4 to 5 A. M.; 52 from 4 to 10 P. M.; 95 from 10 P. M. to 2 A. M.).
26 | Bombardment continued, 129 shells to 2 A. M.; 52 from 4 to 7 P. M.; 77 from 9:30 to 11:15 P. M.
27 | Bombardment continued, 144 shells (53 from 12 to 2 P. M.; 91 from 4 to 5 P. M.).

28

Bombardment continued, 126 shells (1 at 1 A. M.; 4 at 10:30 A. M.; 16 from 4 to 6 P. M.; 92 from 7 to 8 P. M.; 13 at 9 P. M.).

29 | Bombardment continued, 59 shells (28 at 5 P. M.; 10 from 7 to 8 P. M.; 21 from 10:30 to midnight).
30 | Bombardment continued, 83 shells (15 from 2 to 3 A. M.; 16 at 10:30 A. M.; 12 from 4 to 5 P. M.; 40 from 9 to 11 P. M.).
31 | Bombardment continued, 34 shells from 9 to 11 P. M.

September, 1917

1 | Bombardment continued, 107 shells (83 from 1 to 4 P. M.; 24 at 8:30 P. M.).
2 | Bombardment continued, 12 shells (2 at 6:30 A. M.; 7 from 10 to 11:15 A. M.; 3 at 6 P. M.).
3 | Third anniversary of the first bombardment of September 3, 1914. Bombardment continued, 10 shells.

Postscript

The present chronicle stops at the third anniversary of the first bombardment. On September 2, 1914 the French army evacuated Reims. The bombardment actually began on September 3, 1914 by the dropping of two bombs by German aviators. It was an unexpected preface to the formal bombardment of the next day, when the Germans sent 176 shells into Reims, although actually in possession of the city. September 3, 1917 thus completes three full years of the bombardment, which has accomplished nothing save the ruin of the city and the destruction of its great cathedral.

After a city has been besieged for three years; after it has, for that time, been subjected to the agony of modern artillery warfare, it would seem quite time to review such details as are obtainable and survey the results achieved by the besiegers. The daily summary given in the foregoing pages shows exactly what the Germans have done and what they have accomplished. Day after day, particularly in 1917, they have thrown innumerable projectiles into Reims, and wrought the utmost damage they could. But the outstanding fact to the French is that the Germans are still bombarding Reims. The siege did not stop with the end of the third year, but it is still going on as these pages pass through the press. This is the triumph of Reims, that it is still French, bent and broken as it is, bowed as its vast church is with the great trials to which it has been subjected, the city and its cathedral are still French! Before this ruined heap of stones—for Reims is scarce more than that, this may yield small comfort. Yet Reims is still France, knock the barbarian ever so fiercely.

It is, perhaps ominous that while detailed figures of the German missiles thrown in Reims have been published in the local newspapers rather freely, no word as to the destruction they may have accomplished has been uttered. The veil that covers Reims has not yet been lifted, nor can the full measure of her agony yet be reckoned.

THE HÔTEL DE VILLE

The Buildings of Reims

THE CATHEDRAL OF NOTRE DAME

This magnificent church was begun May 6, 1211, the foundation stone being laid on that date on the site of an earlier edifice burned in 1210. The work was pushed so rapidly that the choir was completed and occupied September 7, 1241. The architect was Jean d'Orbais, to whom the initial conception is due, and who continued in charge to 1231. He was succeeded by Jean Le Loup (1231-1247), who completed the choir and about 1240 undertook the façade of the north transept. Gaucher de Reims (1247-1255) apparently began the west portals towards 1255, before the nave was completed. Bernard de Soissons (1255-1290) built the five west bays of the nave and the great west rose window. He was succeeded by Robert de Coucy, who died in 1311, to whom is attributed the towers and the upper parts of the west front. The roof and upper parts of the cathedral were heavily damaged by fire in 1481, but repairs were speedily carried out. Restored several times in the nineteenth century, new restorations were in progress until the time of the first bombardment.

The cathedral is a vast and splendid church, with a nave of nine bays, transepts with aisles, and a rather short choir, surrounded with five chapels. There are no nave chapels. The decorations are of great magnificence, the external sculptures, especially those of the great west portals and the portals of the north transept, being most elaborate, and including some of the finest mediæval sculptures in France. The interior is noted for the arcaded screen applied to the west end of the nave, surrounding the central doorway, consisting of a series of niches with statues. The foliated capitals of the nave piers also deserve mention. The glass of the windows, which suffered some unfortunate changes in the XVIII century, was of extraordinary beauty and interest, and ranked among the finest in France; most of it was destroyed in the bombardment. The cathedral had a superb collection of tapestries, fortunately removed to Paris before the fire. The Treasury of the cathedral contained many rare and beautiful objects.

Notwithstanding the numerous and heavy bombardments to which the cathedral has been subjected, the statue of Jeanne d'Arc by Paul Dubois, erected in the open space before the cathedral (Place du Parvis) in 1896, has not yet been touched by shells. The sculpture of the west front and of other exposed parts were heavily protected by sand bags immediately after the first bombardment.

Palais Archiépiscopal

Immediately adjoins the south transept of the cathedral. Repaired and rebuilt many times. The oldest surviving portion is the chapel called the "Chapelle Palatine," built in two stories, and attributed to Jean d'Orbais, the architect of the cathedral. It lost its roof early in the bombardment. The great hall of the place, called the "Salle du Tau" was built at the end of the XV century; it contains a Gothic chimneypiece dating from 1498. The apartments of the King consisting of five rooms, restored in 1825, were richly decorated. The palace was totally destroyed in the bombardment.

THE ABBEY CHURCH OF ST. REMI

One of the most beautiful Romanesque churches in northern France. The larger part of its structure dates from 1005 to 1049, having been built in three efforts within that time. The choir, with its fine circlet of radiating chapels, was built between 1170 and 1190. The south transept front was rebuilt in 1506. The church has been many times repaired and its form and structure modified. The west front was so completely modified after 1840 that only the two lower stages remain of the earlier building. The building is of vast size, and the upper windows contained some remarkable glass. The tomb of St. Remi, the bishop of Reims who baptized Clovis, and which for centuries was a famous place of pilgrimage, was built in 1847, replacing an earlier monument destroyed in the Revolution, which, in its turn, replaced an earlier memorial.

ST. JACQUES

Of the church begun in 1190 and continued in the first years of the XII century, only fragmentary parts remain. It was partially reconstructed at the beginning of the XIV century. The choir and its chapels date from the XVI century. The lantern of the crossing replaced a Gothic spire removed in 1711, and the north transept and other parts were rebuilt in 1854.

ST. MAURICE

The choir, dating from 1627, is flanked by a beautiful flamboyant chapel built towards 1546. The nave is modern.

MODERN CHURCHES

St. André, built between 1857 and 1864.—St. Thomas, built in 1847.—St. Geneviève, built in 1877.—St. Clotilde, built in commemoration of the fourteenth centenary of the baptism of Clovis (496-1896).—St. Benoît and St. Jean Baptiste de la Salle are very recent churches.

HÔTEL DE VILLE

The fine Hôtel de Ville was commenced in 1627 on the plans of a native architect, Jean Bonhomme. Begun with the left pavilion, the main façade, with the central pavilion and its tower, were completed by 1630. Left incomplete for nearly two centuries, the right pavilion was added in 1823-1825 by Serrurier, also an architect of Reims. Great additions and new buildings around a central court were added between 1875 and 1880. The relief of Louis XIII in the central pediment by Milhomme, placed in 1818, occupies the place of an earlier one by Nicolas Jacques, placed in 1636 and destroyed in the Revolution. The building contained the Museum and Public Library of Reims. Destroyed by fire, May 3, 1917. The more valuable books of the library, and the departmental archives had long before been placed in safety elsewhere.

BUILDINGS OF NOTE

The Place Royale, begun in 1757, is closed on one side by the Hôtel des Fermes, a stately edifice with a central pediment supported by columns. In the centre of the Place is a statue of Louis XV by Cartellier, replacing an earlier statue by Pigalle, inaugurated in 1765 and destroyed in the Revolution. Two allegorical groups by Pigalle for the pedestal survived.

Maison des Musiciens, dating from the time of St. Louis, has a remarkable façade of large twin-windows alternating with trilobed niches containing seated statues of musicians, larger than life size. Purchased by the city and by public subscription in 1905.

Reims contains two other dwellings of the XIII century. A larger house in the Rue de Tambour, with a completely modernized interior, offers a façade of much interest, notwithstanding a repair in 1832.—Another house, in the Rue de Sedan, is a simple artisan's dwelling, retaining almost intact its gabled façade of the end of the XIII century.—A Gothic building in the same street, transformed into a school in 1890, retains parts of the XVI and XVII centuries.—A house in the Rue de Vesle has a façade of the XIV century, destroyed and burned by the bombardment of September 19, 1914.—Fragments of the former priory of St. Bernard remain in the same street behind a modern store front.—A house in the Rue de la Grue is an interesting type of the end of the XVII century; ruined in bombardment of September 19, 1914.

Hôtel de Bezannes, a large dwelling of the middle of the XV century, was probably built by Pierre de Bezannes, lieutenant of the inhabitants of Reims (1450-1467), whose arms remain on the buildings of the court. It became a school in 1901.

Hôtel Le Vergeur, a large building retaining fragments of all styles since the end of the XIII century.—The Maison du Long-Vêtu, the birthplace of Colbert, the celebrated minister of Louis XIV, has a façade of the middle ages, and another of the XVII century.—A hotel of the XV century, in the Rue de Pouilly, was the dwelling of an uncle of Colbert's. It is now the house of the Sœurs de l'Espérance; a part of the façade was demolished in 1908.—Pavilion de Muire, built by Nicolas Noel, lord of Muire, towards 1565, a remarkable structure in the style of Henri III.—Hôtel de Montlaurent of the XVI century, has lost much of its interior interest, but the court offers some of the primitive decoration.—Hôtel de la Salle, the birthplace of J. B. de la Salle, is one of the most beautiful types of domestic Renaissance architecture in Reims; the façade bears the date 1545.—Cour Mopinot has a portico of the XVI century.—Hôtel Thiret de Prin was built under Henri IV; Richelieu lived in this building during his sojourn in Reims in 1641.—Maison de l'Ecu de Reims bears the date 1652.—Maison de Jean Maillefer, built in 1651.—Hôtel Lagoille de Courtagnon has a façade of the XVII century.—Hôtel Rogier, built towards 1750; sold at public auction, in January, 1914.—Two wooden houses with pointed gables of the end of the XV century, are in the Place des Marchés.—An inscription on the Hôtel de la Maison-Rouge states that the father and mother of Jeanne d'Arc were lodged in this building at public expense in 1429, at the coronation of Charles VII. It was then known as the Ane Rayé.—The Société des Amis du Vieux Reims maintained an extensive collection of objects relating to Reims in the former Hôtel Coquebert.

The Porte de Mars, a Roman triumphal arch of three arches, is the most considerable monument in Reims dating from Roman times.

EDUCATIONAL BUILDINGS

Grand Séminaire, occupies the buildings of the former abbey of St. Denis. The original parts are of the time of Louis XV; they were considerably modified and added to in 1822, when the seminary took possession of them. It later served as the Musée des Beaux-Arts, inaugurated in 1913.

The Lycée occupies the buildings of the University or college founded by the Cardinal of Lorraine in the XVI century, and rebuilt in 1676. Although greatly changed, the interior court, half wood, half masonry, retains the original aspect of the XVI century. Much new construction was added at the end of the last century.

HOSPITALS

Hôtel-Dieu [Civil Hospital], founded by archbishop Hincmar in 848, was transferred to the buildings of the abbey of St. Remi in 1827. Repaired and rebuilt at various times, they retain few vestiges of the middle ages. They were partly renewed after a fire in 1774. Burned in the bombardment of August 13, 1916.—Hôpital General, occupies the former college of the Jesuits, the older parts dating from the XVII century. The former library, now the linen room, is an apartment of some magnificence. It adjoins the church of St. Maurice.—Hôpital St. Marcoul, or home for incurables, dates from about 1650; it was added to in 1651, 1869 and 1873.—Maison de Retraite, a modern foundation due to bequests and munificent gifts.

OTHER BUILDINGS

Palais de Justice, built in 1845, on the site of the old Hôtel Dieu; a new façade was recently added.—Théâtre, built between 1866-1873.—Chambre de Commerce occupies the former Hôtel Clicquot-Ponsardin, in the style of Louis XVI.

The Destructions of the Buildings of Reims

While the material for a survey of the destruction of the buildings of Reims is not yet available, the following notes may be found of interest in forming a judgment on the effects of the bombardment, and its military uselessness. The record is manifestly incomplete, for practically the entire city has been destroyed.

THE CATHEDRAL

1914

September 4. The window glass in the aisle of the north transept was broken by a bomb falling in the adjoining street. Other shells fell directly on the cathedral, striking the gable of the north transept; the upper nave windows were pierced, and the rose window over the central west portal. Some of the portal statues, including the Virgin of the group of the Visitation, and an apostle of the south porch were broken. There were various external indications of projectiles and minor injuries.

September 17. Three shells fell on the cathedral, striking the stone gallery and roof of the north transept; the chevet was subjected to similar injury, and the glass of the choir chapel windows was destroyed.

September 18. Thirteen shells fell on the cathedral. The windows of the south aisle of the nave to the transept were broken, many being emptied of their ancient glass. The buttresses on the south side were mutilated in their lower parts, and many of the pinnacles broken off or destroyed. The flying buttress at the angle of the choir and north transept was entirely destroyed. The stone gallery surrounding the base of the nave roof was ruined in many places, and parts of it thrown onto the roof created other injuries and broke windows.

September 19. The day of the fire. Sixteen shells on the cathedral, one on the summit of the north tower. At 2:30 P. M. (the exact hour varies in different accounts) an incendiary bomb set afire the scaffolding erected in May, 1913, for the repair of this tower. Although not the first catastrophe, it was the most serious. The fire spread with great rapidity, the great roof, with its magnificent internal woodwork of the fifteenth century, was wholly consumed. The "Clocher à l'Ange", at the furthest extremity of the roof, and which dated from 1485, fell. Its name was derived from a copper angel formerly on the summit, removed for security in 1860. The carillon on the low tower at the crossing of the nave and transept, and which had been re-established by the Académie Nationale de Reims, was destroyed. Much of the old glass in the upper windows, dating from the thirteenth century, was destroyed, as well as much of the external sculpture. The internal injuries were also very grave. The cathedral was filled with straw, requisitioned by the German command for the use of wounded German soldiers it was proposed to place within the church, but who were only taken there after the evacuation; some of them lost their lives in the fire. The greater part of the interior furniture was destroyed, including the eighteenth century woodwork of the choir, together with the stalls and the archiepiscopal throne. A tapestry of the coronation of Charles X was lost. The remarkable sculptures surrounding the interior of the nave doorway were ruined.

September 24. Three bombs struck the cathedral, one of which fell on the vault of the crossing, bared by the fire of September 19. One struck the third buttress on the south side of the nave.

October 12. A bomb of large calibre fell on the high gallery of the chevet, ruining eight metres of the arcading. Two gargoyles of the chevet were broken off.

October 13. A shell fell on the north side of the cathedral at 3 P. M.

November 11. A bomb fell near the cathedral, enveloping it in thick clouds of smoke.

November 12. A shell exploded on the roof, demolishing a pinnacle on the south side of the chevet, and damaging some sculptures. Shrapnel fell within near the high altar.

November 22. Two shells fell on the superstructure, accomplishing no great harm.

1915

February 26. Two shells fell on the cathedral.

March 28. A Taube dropped a bomb on the cathedral apse.

June 1. The "Communiqué Officiel" of this date, for 3 P. M., says the cathedral was particularly bombarded. This is not mentioned in the local reports.

June 15. Several shells fell on the cathedral.

1917

April 15. 15 shells fell on the cathedral. The chapel of the Cardinal ruined.

April 19. 20 shells on the cathedral. The north tower, vaults and transept injured.

The cathedral was subjected to other injuries on April 20 (2 shells), April 21 (8 shells), April 22 (3 shells), April 23 and April 24. The angle of the south transept and the chevet was particularly hurt on the date last named.

PALAIS ARCHIÉPISCOPAL

Burned on September 19, 1914, in which the cathedral was so seriously injured. The building was almost wholly destroyed. The chapel lost its roof and glass. The library and collections of the Académie Nationale de Reims, which were housed in the palace, were lost, together with the archeological collections, including the prehistoric collection (Collection Posteaux) and the ethnographic collection (Musée Guillot).

ST. REMI

Injured in the bombardment of September 4, 1914. The vault of the south transept fell through, the ancient glass of the apse triforium and of the upper nave windows was broken, as well as the modern glass of the apse chapels windows, and in other parts. The interior was ruined, the losses including a painting "The Entry of Clovis to Reims" and one of the tapestries of the "Life of St. Remi". The chapel facing the baptismal font suffered some exterior injury.

A bomb destroyed the apse chapel of Notre Dame de l'Usine et de l'Atelier on November 16, 1914. On August 13, 1916, the church was menaced by the fire of the Hôtel Dieu (Civil Hospital). Flames attacked the north transept, destroying the glass of the rose window.

OTHER CHURCHES

St. André. On September 19, 1914, a bomb fell on the left transept portal, breaking the glass in near-by parts; painting of "The Baptism of Clovis" lost. September 22, 1914, a shell fell on the church at 11 A. M. April 15, 1917, it caught fire, and it was again injured on April 28.

St. Jean Baptiste de la Salle. 3 shells fell on this church in the bombardment of December, 1914. The glass was broken and the interior injured.

St. Clotilde. September 22, 1914, most of the glass ruined by a near-by shell. January 4, 1915, injured by 4 bombs.

St. Benoît. 3 shells in January, 1915.

St. Geneviève. Injured in the bombardment of April 15, 1917.

CIVIC BUILDINGS

Hôtel de Ville. Lost the glass of the west side September 14, 1914. Received several shells in the bombardment of September 19, 1914. A fire started, but no essential injury resulted. It was gravely injured April 21, 1917, and was destroyed by fire on May 3.

Palais de Justice. Lost the glass of its main façades September 4, 1914. A shell fell through the roof on October 2, 1914, injuring the interior; both façades were hurt, especially the newer one. February 3, 1916, some fragments of French shells fell on the building. September 18, 1916, a bomb fell through the roof and upper story.

Hôtel Dieu [Civil Hospital]. Some shells fell on the buildings on September 18, 1914; two patients were killed and another buried under débris; two nurses were badly wounded. On August 13, 1916, the Hospital caught fire in the bombardment and was destroyed save for two pavilions.

Théâtre. The lantern was destroyed in the bombardment of September 4, 1914, and the chandelier suspended from it fell down. A bomb fell on the building on October 5, 1914.

Musée des Beaux-Arts. Injured September 4, 1914, by three bombs on the west front. Much interior damage and many valuable paintings lost.

Sous-Préfecture. Burned September 18, 1914.

Place Royale. Many of the buildings surroundings this place were burned in the bombardment of September 19, 1914.

Hôtel de la Salle. Injured by a shell in November, 1914.

Gothic House in Rue de Vesle. Wholly ruined in the catastrophe of September 19, 1914.

*** END OF THE PROJECT GUTENBERG EBOOK THE BOMBARDMENT OF REIMS ***

Updated editions will replace the previous one—the old editions will be renamed.

Creating the works from print editions not protected by U.S. copyright law means that no one owns a United States copyright in these works, so the Foundation (and you!) can copy and distribute it in the United States without permission and without paying copyright royalties. Special rules, set forth in the General Terms of Use part of this license, apply to copying and distributing Project Gutenberg™ electronic works to protect the PROJECT GUTENBERG™ concept and trademark. Project Gutenberg is a registered trademark, and may not be used if you charge for an eBook, except by following the terms of the trademark license, including paying royalties for use of the Project Gutenberg trademark. If you do not charge anything for copies of this eBook, complying with the trademark license is very easy. You may use this eBook for nearly any purpose such as creation of derivative works, reports, performances and research. Project Gutenberg eBooks may be modified and printed and given away—you may do practically ANYTHING in the United States with eBooks not protected by U.S. copyright law. Redistribution is subject to the trademark license, especially commercial redistribution.

START: FULL LICENSE

THE FULL PROJECT GUTENBERG LICENSE

PLEASE READ THIS BEFORE YOU DISTRIBUTE OR USE THIS WORK

To protect the Project Gutenberg™ mission of promoting the free distribution of electronic works, by using or distributing this work (or any other work associated in any way with the phrase “Project Gutenberg”), you agree to comply with all the terms of the Full Project Gutenberg™ License available with this file or online at www.gutenberg.org/license.

Section 1. General Terms of Use and Redistributing Project Gutenberg™ electronic works

1.A. By reading or using any part of this Project Gutenberg™ electronic work, you indicate that you have read, understand, agree to and accept all the terms of this license and intellectual property (trademark/copyright) agreement. If you do not agree to abide by all the terms of this agreement, you must cease using and return or destroy all copies of Project Gutenberg™ electronic works in your possession. If you paid a fee for obtaining a copy of or access to a Project Gutenberg™ electronic work and you do not agree to be bound by the terms of this agreement, you may obtain a refund from the person or entity to whom you paid the fee as set forth in paragraph 1.E.8.

1.B. “Project Gutenberg” is a registered trademark. It may only be used on or associated in any way with an electronic work by people who agree to be bound by the terms of this agreement. There are a few things that you can do with most Project Gutenberg™ electronic works even without complying with the full terms of this agreement. See paragraph 1.C below. There are a lot of things you can do with Project Gutenberg™ electronic works if you follow the terms of this agreement and help preserve free future access to Project Gutenberg™ electronic works. See paragraph 1.E below.

1.C. The Project Gutenberg Literary Archive Foundation (“the Foundation” or PGLAF), owns a compilation copyright in the collection of Project Gutenberg™ electronic works. Nearly all the individual works in the collection are in the public domain in the United States. If an individual work is unprotected by copyright law in the United States and you are located in the United States, we do not claim a right to prevent you from copying, distributing, performing, displaying or creating derivative works based on the work as long as all references to Project Gutenberg are removed. Of course, we hope that you will support the Project Gutenberg™ mission of promoting free access to electronic works by freely sharing Project Gutenberg™ works in compliance with the terms of this agreement for keeping the Project Gutenberg™ name associated with the work. You can easily comply with the terms of this agreement by keeping this work in the same format with its attached full Project Gutenberg™ License when you share it without charge with others.

1.D. The copyright laws of the place where you are located also govern what you can do with this work. Copyright laws in most countries are in a constant state of change. If you are outside the United States, check the laws of your country in addition to the terms of this agreement before downloading, copying, displaying, performing, distributing or creating derivative works based on this work or any other Project Gutenberg™ work. The Foundation makes no representations concerning the copyright status of any work in any country other than the United States.

1.E. Unless you have removed all references to Project Gutenberg:

1.E.1. The following sentence, with active links to, or other immediate access to, the full Project Gutenberg™ License must appear prominently whenever any copy of a Project Gutenberg™ work (any work on which the phrase “Project Gutenberg” appears, or with which the phrase “Project Gutenberg” is associated) is accessed, displayed, performed, viewed, copied or distributed:

This eBook is for the use of anyone anywhere in the United States and most other parts of the world at no cost and with almost no restrictions whatsoever. You may copy it, give it away or re-use it under the terms of the Project Gutenberg License included with this eBook or online at www.gutenberg.org. If you are not located in the United States, you will have to check the laws of the country where you are located before using this eBook.

1.E.2. If an individual Project Gutenberg™ electronic work is derived from texts not protected by U.S. copyright law (does not contain a notice indicating that it is posted with permission of the copyright holder), the work can be copied and distributed to anyone in the United States without paying any fees or charges. If you are redistributing or providing access to a work with the phrase “Project Gutenberg” associated with or appearing on the work, you must comply either with the requirements of paragraphs 1.E.1 through 1.E.7 or obtain permission for the use of the work and the Project Gutenberg™ trademark as set forth in paragraphs 1.E.8 or 1.E.9.

1.E.3. If an individual Project Gutenberg™ electronic work is posted with the permission of the copyright holder, your use and distribution must comply with both paragraphs 1.E.1 through 1.E.7 and any additional terms imposed by the copyright holder. Additional terms will be linked to the Project Gutenberg™ License for all works posted with the permission of the copyright holder found at the beginning of this work.

1.E.4. Do not unlink or detach or remove the full Project Gutenberg™ License terms from this work, or any files containing a part of this work or any other work associated with Project Gutenberg™.

1.E.5. Do not copy, display, perform, distribute or redistribute this electronic work, or any part of this electronic work, without prominently displaying the sentence set forth in paragraph 1.E.1 with active links or immediate access to the full terms of the Project Gutenberg™ License.

1.E.6. You may convert to and distribute this work in any binary, compressed, marked up, nonproprietary or proprietary form, including any word processing or hypertext form. However, if you provide access to or distribute copies of a Project Gutenberg™ work in a format other than “Plain Vanilla ASCII” or other format used in the official version posted on the official Project Gutenberg™ website (www.gutenberg.org), you must, at no additional cost, fee or expense to the user, provide a copy, a means of exporting a copy, or a means of obtaining a copy upon request, of the work in its original “Plain Vanilla ASCII” or other form. Any alternate format must include the full Project Gutenberg™ License as specified in paragraph 1.E.1.

1.E.7. Do not charge a fee for access to, viewing, displaying, performing, copying or distributing any Project Gutenberg™ works unless you comply with paragraph 1.E.8 or 1.E.9.

1.E.8. You may charge a reasonable fee for copies of or providing access to or distributing Project Gutenberg™ electronic works provided that:

- • You pay a royalty fee of 20% of the gross profits you derive from the use of Project Gutenberg™ works calculated using the method you already use to calculate your applicable taxes. The fee is owed to the owner of the Project Gutenberg™ trademark, but he has agreed to donate royalties under this paragraph to the Project Gutenberg Literary Archive Foundation. Royalty payments must be paid within 60 days following each date on which you prepare (or are legally required to prepare) your periodic tax returns. Royalty payments should be clearly marked as such and sent to the Project Gutenberg Literary Archive Foundation at the address specified in Section 4, “Information about donations to the Project Gutenberg Literary Archive Foundation.”

- • You provide a full refund of any money paid by a user who notifies you in writing (or by e-mail) within 30 days of receipt that s/he does not agree to the terms of the full Project Gutenberg™ License. You must require such a user to return or destroy all copies of the works possessed in a physical medium and discontinue all use of and all access to other copies of Project Gutenberg™ works.

- • You provide, in accordance with paragraph 1.F.3, a full refund of any money paid for a work or a replacement copy, if a defect in the electronic work is discovered and reported to you within 90 days of receipt of the work.

- • You comply with all other terms of this agreement for free distribution of Project Gutenberg™ works.

1.E.9. If you wish to charge a fee or distribute a Project Gutenberg™ electronic work or group of works on different terms than are set forth in this agreement, you must obtain permission in writing from the Project Gutenberg Literary Archive Foundation, the manager of the Project Gutenberg™ trademark. Contact the Foundation as set forth in Section 3 below.

1.F.

1.F.1. Project Gutenberg volunteers and employees expend considerable effort to identify, do copyright research on, transcribe and proofread works not protected by U.S. copyright law in creating the Project Gutenberg™ collection. Despite these efforts, Project Gutenberg™ electronic works, and the medium on which they may be stored, may contain “Defects,” such as, but not limited to, incomplete, inaccurate or corrupt data, transcription errors, a copyright or other intellectual property infringement, a defective or damaged disk or other medium, a computer virus, or computer codes that damage or cannot be read by your equipment.

1.F.2. LIMITED WARRANTY, DISCLAIMER OF DAMAGES - Except for the “Right of Replacement or Refund” described in paragraph 1.F.3, the Project Gutenberg Literary Archive Foundation, the owner of the Project Gutenberg™ trademark, and any other party distributing a Project Gutenberg™ electronic work under this agreement, disclaim all liability to you for damages, costs and expenses, including legal fees. YOU AGREE THAT YOU HAVE NO REMEDIES FOR NEGLIGENCE, STRICT LIABILITY, BREACH OF WARRANTY OR BREACH OF CONTRACT EXCEPT THOSE PROVIDED IN PARAGRAPH 1.F.3. YOU AGREE THAT THE FOUNDATION, THE TRADEMARK OWNER, AND ANY DISTRIBUTOR UNDER THIS AGREEMENT WILL NOT BE LIABLE TO YOU FOR ACTUAL, DIRECT, INDIRECT, CONSEQUENTIAL, PUNITIVE OR INCIDENTAL DAMAGES EVEN IF YOU GIVE NOTICE OF THE POSSIBILITY OF SUCH DAMAGE.

1.F.3. LIMITED RIGHT OF REPLACEMENT OR REFUND - If you discover a defect in this electronic work within 90 days of receiving it, you can receive a refund of the money (if any) you paid for it by sending a written explanation to the person you received the work from. If you received the work on a physical medium, you must return the medium with your written explanation. The person or entity that provided you with the defective work may elect to provide a replacement copy in lieu of a refund. If you received the work electronically, the person or entity providing it to you may choose to give you a second opportunity to receive the work electronically in lieu of a refund. If the second copy is also defective, you may demand a refund in writing without further opportunities to fix the problem.

1.F.4. Except for the limited right of replacement or refund set forth in paragraph 1.F.3, this work is provided to you ‘AS-IS’, WITH NO OTHER WARRANTIES OF ANY KIND, EXPRESS OR IMPLIED, INCLUDING BUT NOT LIMITED TO WARRANTIES OF MERCHANTABILITY OR FITNESS FOR ANY PURPOSE.

1.F.5. Some states do not allow disclaimers of certain implied warranties or the exclusion or limitation of certain types of damages. If any disclaimer or limitation set forth in this agreement violates the law of the state applicable to this agreement, the agreement shall be interpreted to make the maximum disclaimer or limitation permitted by the applicable state law. The invalidity or unenforceability of any provision of this agreement shall not void the remaining provisions.

1.F.6. INDEMNITY - You agree to indemnify and hold the Foundation, the trademark owner, any agent or employee of the Foundation, anyone providing copies of Project Gutenberg™ electronic works in accordance with this agreement, and any volunteers associated with the production, promotion and distribution of Project Gutenberg™ electronic works, harmless from all liability, costs and expenses, including legal fees, that arise directly or indirectly from any of the following which you do or cause to occur: (a) distribution of this or any Project Gutenberg™ work, (b) alteration, modification, or additions or deletions to any Project Gutenberg™ work, and (c) any Defect you cause.

Section 2. Information about the Mission of Project Gutenberg™

Project Gutenberg™ is synonymous with the free distribution of electronic works in formats readable by the widest variety of computers including obsolete, old, middle-aged and new computers. It exists because of the efforts of hundreds of volunteers and donations from people in all walks of life.

Volunteers and financial support to provide volunteers with the assistance they need are critical to reaching Project Gutenberg™’s goals and ensuring that the Project Gutenberg™ collection will remain freely available for generations to come. In 2001, the Project Gutenberg Literary Archive Foundation was created to provide a secure and permanent future for Project Gutenberg™ and future generations. To learn more about the Project Gutenberg Literary Archive Foundation and how your efforts and donations can help, see Sections 3 and 4 and the Foundation information page at www.gutenberg.org.

Section 3. Information about the Project Gutenberg Literary Archive Foundation

The Project Gutenberg Literary Archive Foundation is a non-profit 501(c)(3) educational corporation organized under the laws of the state of Mississippi and granted tax exempt status by the Internal Revenue Service. The Foundation’s EIN or federal tax identification number is 64-6221541. Contributions to the Project Gutenberg Literary Archive Foundation are tax deductible to the full extent permitted by U.S. federal laws and your state’s laws.

The Foundation’s business office is located at 809 North 1500 West, Salt Lake City, UT 84116, (801) 596-1887. Email contact links and up to date contact information can be found at the Foundation’s website and official page at www.gutenberg.org/contact

Section 4. Information about Donations to the Project Gutenberg Literary Archive Foundation

Project Gutenberg™ depends upon and cannot survive without widespread public support and donations to carry out its mission of increasing the number of public domain and licensed works that can be freely distributed in machine-readable form accessible by the widest array of equipment including outdated equipment. Many small donations ($1 to $5,000) are particularly important to maintaining tax exempt status with the IRS.

The Foundation is committed to complying with the laws regulating charities and charitable donations in all 50 states of the United States. Compliance requirements are not uniform and it takes a considerable effort, much paperwork and many fees to meet and keep up with these requirements. We do not solicit donations in locations where we have not received written confirmation of compliance. To SEND DONATIONS or determine the status of compliance for any particular state visit www.gutenberg.org/donate.

While we cannot and do not solicit contributions from states where we have not met the solicitation requirements, we know of no prohibition against accepting unsolicited donations from donors in such states who approach us with offers to donate.

International donations are gratefully accepted, but we cannot make any statements concerning tax treatment of donations received from outside the United States. U.S. laws alone swamp our small staff.

Please check the Project Gutenberg web pages for current donation methods and addresses. Donations are accepted in a number of other ways including checks, online payments and credit card donations. To donate, please visit: www.gutenberg.org/donate.

Section 5. General Information About Project Gutenberg™ electronic works

Professor Michael S. Hart was the originator of the Project Gutenberg™ concept of a library of electronic works that could be freely shared with anyone. For forty years, he produced and distributed Project Gutenberg™ eBooks with only a loose network of volunteer support.

Project Gutenberg™ eBooks are often created from several printed editions, all of which are confirmed as not protected by copyright in the U.S. unless a copyright notice is included. Thus, we do not necessarily keep eBooks in compliance with any particular paper edition.

Most people start at our website which has the main PG search facility: www.gutenberg.org.

This website includes information about Project Gutenberg™, including how to make donations to the Project Gutenberg Literary Archive Foundation, how to help produce our new eBooks, and how to subscribe to our email newsletter to hear about new eBooks.

Table of Contents

- The BOMBARDMENT of REIMS
- CONTENTS
- ILLUSTRATIONS
- The Bombardment of Reims
- 1914
- September, 1914
- October, 1914
- November, 1914
- December, 1914
- 1915
- January, 1915
- February, 1915
- March, 1915
- April, 1915
- May, 1915
- June, 1915
- July, 1915
- August, 1915
- September, 1915
- October, 1915
- November, 1915
- December, 1915
- 1916
- January, 1916
- February, 1916
- March, 1916
- April, 1916
- May, 1916
- June, 1916
- July, 1916
- August, 1916
- September, 1916
- October, 1916
- November, 1916
- December, 1916
- 1917
- January, 1917
- February, 1917
- March, 1917
- April, 1917
- May, 1917
- June, 1917
- July, 1917
- August, 1917
- September, 1917
- Postscript

- The Buildings of Reims

- THE CATHEDRAL OF NOTRE DAME
- Palais Archiépiscopal
- THE ABBEY CHURCH OF ST. REMI
- ST. JACQUES
- ST. MAURICE
- MODERN CHURCHES
- HÔTEL DE VILLE
- BUILDINGS OF NOTE
- EDUCATIONAL BUILDINGS
- HOSPITALS
- OTHER BUILDINGS

- The Destructions of the Buildings of Reims

- THE CATHEDRAL

- 1914
- 1915
- 1917

- PALAIS ARCHIÉPISCOPAL
- ST. REMI
- OTHER CHURCHES
- CIVIC BUILDINGS

- THE FULL PROJECT GUTENBERG LICENSE